┌─────────────────────────────────────────────────────────────────────────────┐
│ Option:  GC  GET COMMANDLINE FROM FILE......................................│
└─────────────────────────────────────────────────────────────────────────────┘

Syntax
═══════════════════════════════════════════════════════════════════════════════
JLUTIL /GC [Parameters] [-Switches]
═══════════════════════════════════════════════════════════════════════════════

Switch Description
═══════════════════════════════════════════════════════════════════════════════
No Switches available at this time.
═══════════════════════════════════════════════════════════════════════════════

Param       Description
═══════════════════════════════════════════════════════════════════════════════
FileName    Name of the File, which contains the commands.
═══════════════════════════════════════════════════════════════════════════════

Explanation
═══════════════════════════════════════════════════════════════════════════════
Reads each line of the InputFile and handles the line as CommandLine.
If you want to save time and i think most of us want to do this,
you should think about using this option. Check how much faster it is
to run your daily JL-Options with or without this trick.

You will be surpriced, how fast it is. And if you have ever thought:
why does the JL's are needing so much time for loading, you must know
the answer. It is this option.

If a error occurs during the use of GC, THE JL's quit. GC writes
the number of the last scanned line of FileName into POS{GC}.@JL,
which is located in the subdirectory WRK. So it is possible to run
the complete FileName, if a error occurs during processing one line
of FileName. All you have to do is, to look in your batch file, if
POS{GC}.@JL exists. Look at the example below to get an impression,
how you could make a loop in your batchfile.

           ┌─Example #1──────────────────────────────────┐
           │ :GC                                         │
           │ JLUTIL /GC DAILY.BEH                        │
           │ IF EXIST %JLPATH%\WRK\POS{GC}.@JL GOTO :GC  │
           └─────────────────────────────────────────────┘

It is not possible to use all options of THE JL's within GC. Specially
the last commandline must not be a option, which doesn't display the
sentence 'The program was xx.xx seconds active.'.

So it is better to setup a InputFile like this:

001.BEH--------------

/MC
/PM ~    -C
/MO
/IL P    -US
/IL RSXD -USL7

---------------------

and running JLUTIL /GC 001.BEH, than using a batch-file like this:

001.BAT--------------

JLUTIL /MC
JLUTIL /PM ~    -C
JLUTIL /MO
JLUTIL /IL P    -US
JLUTIL /IL RSXD -USL7

---------------------

and running 001.bat. Message understood ?


┌─Examples───────────────────────────────────────────────────────────────────┐
└────────────────────────────────────────────────────────────────────────────┘

JLUTIL /GC MDRIV.BEH
:GC
JLUTIL /GC DAILY.BEH
IF EXIST %JLPATH%\WRK\POS{GC}.@JL GOTO :GC

