;
                                 CSHELL.COM                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               7k (55)   537F  1.0        Ed Schram                Z3COM2

  1- Syntax  2- Error Messages                                                


   CSHELL adds pipes and batch files to ZCPR3 and C80.
:1


   Syntax:  CSHELL

:2


Error Messages:


   "Can't Find Program"

    -- C80 program not available.
gh room