;
                               LISTTRAP.RCP                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
                               1.0        Paul Pomerleau 12/85     Z3RCP1

  1- Syntax                                                                   



   LIST-TRAP RCP is an RCP for ZCPR3 systems.  It captures output going to the
list device and puts it into a disk file.  The package is relatively small, so
you can cut out the important part of the .MAC file and put that into  any RCP 
file that you wish.

:1



   Syntax:  OPEN ufn   - open a file for list output

            CLOSE      - close file
