;
                                DOSVER.COM                                    

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               1k (4)    C9B7  0.4        David McCord 7/88        Z3COM2

  1- Syntax                                                                   



   Displays current running version of ZRDOS.
:1


   Syntax:  DOSVER

  Display:  'ZRDOS version n.n is currently running'

              ...where 'n.n' is the current version (1.7, 1.9, etc.), 

      or    'ZRDOS is not currently running'.
