:	The memory comparison utility COMPARM.COM

   COMPARM performs a comparison between two memory areas, either
once, a number of times, or continiously.  It will display memory
locations differing from the comparison pattern.

   Command Syntax:

	COMPARM<return>

   the program is then self prompting.

   Repetition counts of 1-9 are accepted, with the letter C as a
request for continious looping.
