 Byte as 1 or 2 Hex Characters             - PAFHC, LAFHC, MAFHC, SAFHC
 Byte as 1 or 2 Hex Chars (Leading Spaces) - PAHC, LAHC, MAHC, SAHC
 Binary Number as 2 Decimal Characters     - PHL2DC, LHL2DC, MHL2DC, SHL2DC
 Binary Number as 3 Decimal Characters     - PHL3DC, LHL3DC, MHL3DC, SHL3DC
 Binary Number as 4 Decimal Characters     - PHL4DC, LHL4DC, MHL4DC, SHL4DC
 Explanation of Switchable Output
:
PAFHC, LAFHC, SAFHC - Prints binary byte as 1 or 2 hex characters.

  ENTER: A = binary number.
  EXIT:  None.
  USES:  None.

MAFHC - Stores binary byte as 1 or 2 hex characters to memory.

  ENTER: A = binary number,
         DE = address of memory buffer (2 bytes maximum).
  EXIT:  DE = address of byte following output.
  USES:  DE

Usage: PAFHC, console output; LAFHC, printer output; SAFHC, switchable 
output.
:
PAHC, LAHC, SAHC - Prints binary number as 1 or 2 hex characters with 
leading spaces.

  ENTER: A = binary number.
  EXIT:  None.
  USES:  None.

MAHC - Stores binary number as 1 or 2 hex characters with leading spaces to 
memory.

  ENTER: A = binary number,
         DE = address of memory buffer (2 bytes maximum).
  EXIT:  DE = address of byte following output.
  USES:  DE

Usage: PAHC, console output; LAHC, printer output; SAHC, switchable output.
:
PHL2DC LHL2DC, SHL2DC - Prints number as 2 decimal characters with leading 
zeroes.

  ENTER: HL = binary number.
  EXIT:  None.
  USES:  None.

MHL2DC - Stores number as 2 decimal characters with leading zeroes to 
memory.

  ENTER: HL = binary number,
         DE = address of memory buffer (2 bytes).
  EXIT:  DE = address of byte following output.
  USES:  DE

Usage: PHL2DC, console output; LHL2DC, printer output; SHL2DC, switchable 
output.

Output examples:         "00"
                         "01"
                         "10"
:
PHL3DC, LHL3DC, SHL3DC - Prints number as 3 decimal characters with leading 
zeroes.

  ENTER: HL = binary number.
  EXIT:  None.
  USES:  None.

MHL3DC - Stores number as 3 decimal characters with leading zeroes to 
memory.

  ENTER: HL = binary number,
         DE = address of memory buffer (3 bytes maximum).
  EXIT:  DE = address of byte following output.
  USES:  DE

Usage: PHL3DC, console output; LHL3DC, printer output; SHL3DC, switchable 
output.

Output examples:         "000"
                         "001"
                         "010"
:
PHL4DC, LHL4DC, SHL4DC - Prints number as 4 decimal characters with leading 
zeroes.

  ENTER: HL = binary number.
  EXIT:  None.
  USES:  None.

MHL4DC - Stores number as 4 decimal characters with leading zeros to 
memory.

  ENTER: HL = binary number,
         DE = address of memory buffer (4 bytes).
  EXIT:  DE = address of byte following output.
  USES:  DE

Usage: PHL4DC, console output; LHL4DC, printer output; SHL4DC, switchable 
output.

Output examples:         "0000"
                         "0001"
                         "0010"
::ZSLIBS
