;
 (FCP-Resident)                     XIF                                       

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               n/a n/a   n/a   n/a                                 n/a   

  1- Syntax  2- Examples of Use                                               


   XIF, from SYSFCP 1.0,  exits (terminates) all pending conditionals (IFs) in
flow command testing.  It reduces the IF level to 0 (no IF in effect).  If the
current flow state is false, XIF does nothing.  

   XIF is most useful in ZEX GOTO loops.
:1 

   Syntax:  XIF <anytext>
:2

Examples of Use:

   a. ;=LOOP
      XIF
          <statements>
      IF 1 3
          GOTO LOOP
      FI
be toggled between the  CON and 