;
                                    TPA.COM                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               1k (6)    8773  1.1        John W. Fort 10/86       Z3COM9

  1- Syntax  2- Notes  3- Example of Use                                      

   TPA reports  the size  of the current TPA,  as well as  addresses of ZCPR3, 
ZRDOS, and the CBIOS.  Version 1.0 (10/86) by John Fort.
:1


   Syntax:  TPA<cr>

   No help message is displayed.

:2

TPA Notes:

   a.  Assumes ZEX or RSX entry in first page of same.  Will be wrong  size if
       anything diverts BIOS calls.	
:3


Example of Use:

   a. A0:BASE>tpa

      TPA Report.  Vers 1.1
      ~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~~
        TPA from 100h to base ZCPR3 is 49.5k
        ZCPR3      C700
        ZRDOS      CF00
        CBIOS      DD00
AS

:2

   TESTERR Notes:

   a. Additional programs can  be added by including appropriate  bran