;
                                  SLTRAP.RCP                                  

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               2k (13)   DAD2  1.2        Paul Pomerleau 1/86      Z3RCP2

  1- Usage                                                                    




   SLTRAP is  a handy-dandy IO grabber.  The command  'KEY' is used  to change
the key which is used as a TRIGGER.
:1

LIST device:

   The  disk file is opened by the command 'LOPEN filename.typ' where 
   filename.typ is  the  name of  the file  to hold output.  To close 
   the file (write the  text to  disk and  finish the file properly), 
   the command is 'LCLOSE'.

CONSOLE device:

   The disk file is opened by  the command 'SOPEN filename.typ' where 
   filename.typ is  the name  of  the file  to hold output.  The text 
   printed on the screen will not be saved  to file until the TRIGGER 
   KEY is pressed.  Pressing the TRIGGER KEY again will stop the flow 
   of text to  the  designated file.  You may  start  and stop screen 
   trapping  all  you like.  The  default TRIGGER  is '^\'.  'SCLOSE' 
   closes the file.
      SHVAR varx this is a test   <-- define VARX to "THIS IS A TEST" 
 as MBASIC, dBASE 