;
                                 LISTCMD.COM                                  

             Size (recs) CRC   Version    Author/Latest Issue      Disk
              10k (73)   6A14  1.0        Al Heynneman 3/88        Z3COM5

  1- Syntax  2- Error Message                                                 

   LISTCMD displays internal ARUNZ commands from ALIAS.CMD on the current
disk/user or the alternate designated disk drive. 

   Commands longer than 18 characters are truncated, shown in alternate video
mode, and end in '+' to indicate truncation.  Written in Turbo Pascal.
:1


   Syntax:  LISTCMD<cr>
:2

   
Error Message:

   "ALIAS.CMD file not found on current drive,
    or on alternate drive <d> (current user area)."

            LIST afn     <-- RCP-resident only
:2


Examples of Use:

   a. LIST myfile.txt      <-- print MYFILE.TXT 