;
                               ERRORX.COM                                    

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               1k (3)    CDBB  1.1        Jay Sage 6/87            Z3COM3

  1- Usage                                                                   



   ERRORX  disengages  the current error handler,  leaving  no  error  handler 
enabled.   The default error control facility of ZCPR3 is now in effect; if an 
error occurs in the command line,  the command line from that point forward is 
printed (followed by a "?").  Version 1.1 works with either ZCPR3 or ZCPR3.3.
:1


   Usage:  ERRORX
R1 and ERROR2:

   Botè ERROR± anä ERROR² displaù thå erroò linå tï thå useò anä providå h