;
                                DEBUG.LIB                                     

             Size (recs) CRC   Version    Author/Latest Issue      Disk
              20k (160)  839D  1.1        Rob Friefeld 10/87       Z3COM5

  1- Notes                                                                    


   DEBUG.LIB is a temporary,  dynamically loaded,  RCP, for program debugging.
It's a cut-down version of MU3, but memory resident.  Vs 1.1 has been modified
for use with Z33RCP.  The following has been added to the DEBUG RCP package:

	- H  Hex Calculator  (from MU3)
	- F  Fill Memory     syntax: start address, end address, byte value
	- M  Move Memory     syntax: start address, end address, destination

   Vs 1.0 (6/84) by R. Conn.
:1
 DEBUG Notes 

   a. The DEBUG package is about 2300 bytes (with H and CLS).  For those using
      a 2k RCP, the added commands can be deleted.   Alternatively,  about 500
      bytes can be saved by replacing the VLIB routines with a hard coded  CRT
      protocol (HARDVID.LIB).   The original CRT routines are in  TCAPVID.LIB.
      Before assembly,  set the  equate at the  top of the DEBUG file for your
      choice.   HARDVID lib  works  on  Wyse,  Televideo,  Ampex  and  similar
      terminals as is.