;
                                CPUTEST.COM                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               1k (1)    2178  1.0        Bruce Morgen 8/88        Z3COM2

  1- Syntax                                                                   


   CPUTEST identifies the current system's CPU  as belonging to  one  of three
extant CP/M-compatible families:  Intel 8080/8085, Zilog Z80/National, NSC800,
or Hitachi HD61480/Zilog Z80180.  

   CPUTEST is  a routine which was  added to Z3LOC vs 1.2  (8080 test  is from
Bob Freed via Steven Greenberg).
:1


   Syntax:  CPUTEST <cr>
