;
                                    EOF.COM                                   

             Size (recs) CRC   Version    Author/Latest Issue      Disk
               2k (16)   B866  1.0        Rob Friefeld 3/91        Z3COM6

  1- Syntax                                                                   


   EOF displays the last record of a file named on the command line along with
the file size in records and kbytes, plus a crude graphic of how full the last
1k is.  EOF is a programmer's tool to monitor critical program size.

   For ZCPR and CP/M.
:1
 Syntax   EOF [dir:]afn [/offset]
 
 Option   Offset (HEX) for address display.  Default is 0100H.


   Patch data word at 110H is default offset for address display.
