{"text_format":"dbase-jsonl-2026-09-30","columns":[{"name":"WAE_ZEICH","type":"character","width":6},{"name":"WAE_NAME","type":"character","width":30},{"name":"WAE_MENGE","type":"float","width":10,"decimals":0},{"name":"WAE_PREIS","type":"float","width":10,"decimals":4}],"n_rows":9,"rows_kept":9,"cut":false,"deleted_skipped":0,"read_ended":"whole","bounds":"16MiB/16384/4096/first_that_fit","version":"dbase_level_three","encoding_class":"enc_absent","reader":"statdb_count/12"}
["DM","Deutsche Mark",1,1.0000]
["\u009c","Englisches Pfund",1,2.4090]
["$","Amerikanischer Dollar",1,1.6310]
["hfl","Holl\u0084ndische Gulden",100,88.8450]
["FF","Fr. Franc",100,29.3300]
["bfrs","Belgische Franc",100,4.8420]
["Lit","Italienische Lira",1000,1.0165]
["\u0099S","\u0099sterreichische Schillinge",100,14.1930]
["sfr","Schweizerfranken",100,107.9800]