; Contents ---------------------------------------------------------------
;
;   ntime.def -- Module Definition File
;
;   Version 1.0.1 Windows Socket Time Client
;
;   Copyright (C) Frederick W. Bent 1994
;   All rights reserved.
;
;
; Description
;
;	Delcares the local heap and stack size for the finger daemon.
;	Also explicitly exports the callback functions.
;
; Ends -------------------------------------------------------------------

; History ----------------------------------------------------------------
;
; 6/28/94  1.0  Fred Bent     	Started implementation
;
; Ends -------------------------------------------------------------------


NAME         WSNTIME
DESCRIPTION  'Windows Sockets API Time Protocol (RFC868) Client'
EXETYPE      WINDOWS
STUB         'WINSTUB.EXE'
CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE MULTIPLE
HEAPSIZE     8192
STACKSIZE    16384
EXPORTS
             FrameWndProc
             HostDlgProc






