; module-definition file for demo -- used by LINK.EXE

NAME       Demo      ; application's module name

DESCRIPTION  '3-D Sample Microsoft Windows Application'

EXETYPE      WINDOWS    ; required for all Windows applications

STUB       'WINSTUB.EXE' ; Generates error message if application
            ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     1024
STACKSIZE    5120    ; recommended minimum for Windows applications


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
   MainWndProc
   DemoDlgProc
   AboutDlgProc
