
BLOAD and BSAVE are very handy for transferring screen
images from disk to the video display, but only in CGA
and Hercules modes.  These equivalent Toolbox routines
do  exactly the same thing, but work with EGA, VGA and
MCGA adaptors instead.

Interested?