                  (MENU) KEY DEFINITIONS HELP   (AMS Version 5.6.1A)


		Alt-5:  In BATCH mode only, runs DOS 5 DOSSHELL program!

		Alt-B:  Blank the screen, BLACK - for protection from burn in!
		Alt-C:  Change the screen colors, if /nc (no-color) switch NOT used.
		Alt-D:  Display files of present directory, allows viewing & moving.
		Alt-E:  Exit this program in present sub-directory.  (NO RETURN!)
		
		Alt-F:  Display order FORM for the Advanced Menu System.
		Alt-H:  Display Bottom line of help, replace path if there.
		Alt-M:  MENU editor.  Allows editing the present menu and HELP files.
		Alt-O:  Temporary Out to DOS.  Type: exit to return to this program.
		
		Alt-P:  Display 78 chars of present path on bottom line.
		Alt-R:  Return to the FIRST/LAST menu toggle.
		Alt-S:  Save present command buffer in file for later use.
		Alt-T:  Run the quick TEXT editor.  (same as help editor).
		

 (more )           Press the Esc-key to return to the menu           (more )


		Alt-U:  Pfind Utilities menu (if available) will come up.
		Alt-V:  Version and Copyright notice refresh (if gone from top line).
		Alt-W:  WIPE-clear the command buffer & delete the command file.
		Alt-X:  Display files of present directory, allows viewing & deleting.
		
		To move the Hi-Lite bar use the: Home/End-key, 
		                                 PgUp/PgDn-key, 
		                                 /-key, 
		                                 number 1 - 9-key, or 
		                                 FIRST letter of the items key.




 (more )          Press the Esc-key to return to the menu          (more )

     ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
                              Starting  switches
     ▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄

       /1pg    - CRT only handles 1 page of information. (Use on Herc CRTs)
       /batch  - Started by AMS-STRT.BAT want batch temp exit to DOS
       /dbug   - Will list commands & menus to be used.
       /exit[] - [] == program name to run on exit (Batch mode.)
       /exp    - Expert System display mode switch. - 4.40
       /keep   - keep the AMS-TEMP.CMD file (do not delete it) when the 
                 Esc-key is pressed to exit the AMS program. (At least ONE
                 command line MUST use the /b-BATCH mode for a .CMD file
                 to be saved. Then it can be kept!
       /last   - Causes AMS.EXE to create the AMS-NEXT.BAT file with the 
                 last line of the file being: AMS-LAST so that when the 
                 Esc-key is pressed the ASM-LAST.BAT file will be run.
       /mid    - places menu in center of screen like pre 2.0.

 (more )          Press the Esc-key to return to the menu          (more )

     ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
                          Starting  switches  continued
     ▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄

       /nb     - Removes the double line box around the menu title.
       /nc     - No color switching start-up switch. Monochrome will 
                 ALWAYS be used and color mode switching using the C-key
                 will no longer work.

       /path[drive:\path] - allows passing of a default path to AMS.

       /size   - Changes menu box size to fit # of menu items.
       /u      - Use underscore not dash in ams_strt & ams_next etc..
       /U      - Use Pfind Utilities menu to start!  5.1.0
       /w##    - Wait ## min before blanking screen.

 (more )          Press the Esc-key to return to the menu          (more )

     ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
                            Other needed files:
     ▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄

      In the BATCH mode "/b" you will need to start the Advanced Menu System
  using the AMS-STRT.BAT file.  The Advanced Menu System will create the
  file(s) called AMS-NEXT.BAT and last, if you want to return to another 
  BATCH file of menu system you will also need to create a file called 
  AMS-LAST.BAT.

    AMS-STRT.BAT - You create to start the Advanced Menu System. (A 
    AMS_STRT.BAT - sample is on you program disk.)

    AMS-NEXT.BAT - Created by the Advanced Menu System as needed.
    AMS_NEXT.BAT - 

 (more )          Press the Esc-key to return to the menu          (more )

     ▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀▀
                            Other needed files:  (continued)
     ▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄▄

    AMS-LAST.BAT - You create to end the session as desired.	(Need to 
    AMS_LAST.BAT - start the Advanced Menu System with the "/last" 
                   switch.)

    AMSBLANK.BAT - If present (in the same path as AMS.EXE) can run any
                   screen saver program you desire.

 ┌───────────────────────────────────────────────────────────────────────────┐
─┤ (more )         Press the Esc-key to return to the menu         (more ) ├─
 └───────────────────────────────────────────────────────────────────────────┘
