05ÊUL8601:03:37PMÃÏÍÐÏÓÅÒ'Ó ÔÏÏÌÓ ÈÅÌÐ - ÕÓÅÒ ×ÉÎÄÏ×     ¸¸¸¸¸¸¸¸¸¸¸¸¸¸¸¸                        ÔHE ÕSER WINDOW IS A SPECIAL WINDOW     THAT CAN BE USED AS A SCRATCHPAD.  ÔHE  ÃOMBINATORIALITY AND ÄERIVATION         FUNCTIONS AUTOMATICALLY WRITE THEIR     RESULTS TO THE WINDOW.  ÔHE WINDOW WILL AUTOMATICALLY RESHAPE ITSSELF TO BEST   DISPLAY THE DATA WRITTEN TO IT.                                                 ÓELECTING ×INDOW FROM THE ÕTILITIES     SUBMENU WILL TAKE YOU TO THE WINDOW     EDITOR.  ÔHE WINDOW WILL BE DISPLAYED   WITH THE DEFAULT LENGTH OF 17 COLUMNS   AND HEIGHT OF 15 ROWS.  ÂY SELECTING    ÅDIT FROM THE MENU, YOU CAN TYPE A NEW  LINE TO THE WINDOW.  ÃLEAR WILL ERASE   THE WINDOW.                                                                     ÔHE ÕSER WINDOW CAN BE DISPLAYED FROM   THE ÍAIN ÍENU, ÅNTER ÒOW, ÅDIT ÒOW, AND THE ÎOTEPAD BY PRESSING F3.  ÐRESS      ÒÅÔÕÒÎ TO REMOVE THE WINDOW.                                                    
