A modem was found on COM2:
ATI0<cr> = <cr><lf>2886
ATI0<cr> = <cr><lf>2886
ATI1<cr> = <cr><lf>32B8
ATI1<cr> = <cr><lf>
ATI2<cr> = <cr><lf>OK
ATI2<cr> = <cr><lf>OK
ATI3<cr> = <cr><lf>Sportster 28800/Fax V6.0
ATI3<cr> = <cr><lf>Sportster28800/Fax
ATI4<cr> = <cr><lf>USRobotics Sportster 28800 V.34 Fax Settings...
ATI4<cr> = <cr><lf>USRoboticsSportster28800FaxSettings
ATI5<cr> = <cr><lf>USRobotics Sportster 28800 V.34 Fax NVRAM Settings...
ATI5<cr> = <cr><lf>USRoboticsSportster28800FaxNVRAMSettings
ATI6<cr> = <cr><lf>USRobotics Sportster 28800 V.34 Fax Link Diagnostics...
ATI6<cr> = <cr><lf>USRoboticsSportster28800FaxLinkDiagnostics
ATI7<cr> = <cr><lf>Configuration Profile...
ATI7<cr> = <cr><lf>ConfigurationProfile
ATI8<cr> = <cr><lf>ERROR
ATI8<cr> = <cr><lf>ERROR
ATI9<cr> = <cr><lf>ERROR
ATI9<cr> = <cr><lf>ERROR
ATI10<cr> = <cr><lf>ERROR
ATI10<cr> = <cr><lf>ERROR
AT%V<cr> = <cr><lf>ERROR
AT%V<cr> = <cr><lf>ERROR
Modem ID = UNIMODEM5A28D161.
