BASICS:
PRINT will use the printer at LPT1 (Printer Port 1).
Print is designed to work with continuous feed (like dot
matrix) printers or LASER printers.

MENU ITEMS:
PRINT ALL prints the ENTIRE file opened in memory.
PRINT CURRENT prints the currently shown record.
PRINT LAST SEARCH prints the record list from the last
search that was performed.
FORMATTING allows you to choose the type of arrangement
of printing records you require:

VERT prints records up and down on the page and to the
left:
 RECORD1
 ...
 RECORD2
 ...
 etc.

HORIZ prints them left - right so as to minimize paper
used:
  RECORD1......................
  RECORD2......................
  etc.

2 COL prints up and down in two columns:
 RECORD1         RECORD2
 ...             ...
 RECORD3         RECORD4
 ...             ...
      etc.

MASK FIELD NAMES turns the field names used for the
collection on and off for printing. When the box is
checked, the FIELD NAME (such as TYPE, DESCRIPTION, etc.)
is not printed; only the DATA will be printed. LINES PER
PAGE allows you to insert a formfeed after any number of
lines. It defaults to 66 (suitable for Dot Matrix
printers). Set it to 60 or LESS if using a LASER or INK
JET (Paint Jet, etc.) single sheet printer.

USER SELECTABLE MASK CONFIGURATION:
SETUP MASK allows you to define data that will NOT be
printed. This is useful if you're printing a catalogue
do not wish certain items (such as price paid) to be seen
or included.
MASK CONDITION ON/OFF is a toggle to indicate whether or
not MASKING will be implemented.
