The type of input associated  with  a
particular field is displayed  on the
right side of the screen. These input
types are not user changeable,but the
NAMES of the fields (on the left) are
changeable. The data field names will
vary depending on the type of collec-
tion.You may wish to look at a few of
these before editing one  to  see how
they are put together. To EDIT, enter
the field number. Type in the revised
name of the field. A colon at the end
is optional.  You should refer to the
manual for any more details.