InS_StArT
3C1100.COM
1.0
^3Com 3C1100 3Station Ethernet,3C1100.COM,IEM
?The 3Station Product is a diskless workstation.  Use the files created by the INSTALL utility to generate a DOS image file for remote boot.
$OIE0(NODE ADDRESS)Optional Node Address
0
FFFFFFFFFFFF
*RIE0(FRAME)Media Frame Type(s)
?NOTE: Ethernet_802.2 is now the default frame type for ODI Drivers. Existing LANs may be using Ethernet_802.3.
@Ethernet_802.2
Ethernet_802.3
Ethernet_II
Ethernet_SNAP
InS_EnD

