  General Help:  ( Manual Page 10 )


      From the main menu you may press the horizontal arrow keys to
  move to the main menu selection you desire.  Each main menu has a
  number of panels which may be selected by using the up and down
  arrow keys.  Once you have positioned to the panel you desire,
  press the Enter key to make the selection.  Pressing the Esc key
  at the main menu will immediately position you to the EXIT to DOS
  selection.  Pressing the Enter key at this point will leave
  QAPlus.

      Certain Monochrome emulations of color into shades of gray
  yield a highlight that is not visible.  QAPlus will properly
  detect a color monitor.  If you cannot see a highlighted menu bar
  when you start QAPlus, after starting QAPlus, immediately press
  the Right Arrow key once, the Enter key and then the Up Arrow key
  to select Color Off.  This should make the highlight visible.

      The "Press any key" message permits the program to pause to
  permit you to view information.  After you are done, pressing any
  key except the Shift, Caps Lock, Alt, or Ctrl keys will let the
  program continue.

      Pressing the Esc key at any point other than the main menu
  will make the program halt what it was doing and return you to
  the previous menu.  If the Esc key is pressed while the program
  is busy performing tests or printing, it may take a moment before
  it recognizes the Esc request.

      In the Run Tests selection, there are a number of test
  groups.  Within each test group there may be several individual
  tests which may be enabled or disabled.  Use the Up and Down
  arrow keys to move to the test group selected.  If the test is
  enabled, a >> character appears beside the selection.  Use the
  Right and Left keys to position the highlight over the test
  selection you wish to enable or disable and press space bar to
  change the selection.  Pressing the Enter key over any
  highlighted test group initiates those tests.  Pressing the Enter
  key at the bottom selection runs all test groups.
