                      Syncard 96 ISDN Advanced Settings !

Just click on the screen for further information !


Fixed TEI management

TEI : Terminal Equipement Identifier.

For some specific ISDN connections (using D channel), it is possible to choose static TEI specification. Two values may be entered.


NDS

In case of connecting your Syncard 96 to a ISDN PABX equipement (not to a direct line), you may have to specify this parameter to be allowed to emit an outgoig call.

The value for this parameters (one for each B channel) will be specified by your administrator.


SYNAPTEL
   SYNAPTEL, a leading ISDN company !

SYNAPTEL

10ème avenue

855, avenue Roger Salengro

92380 Chaville

FRANCE

tel:	33-1-41-15-44-00

fax:	33-1-44-15-12-13

Talk with us at WWW.SYNAPTEL.FR !


THE WORLD

This represents the different sites you can connect to with the Synaptel Products !