; NT_USERDB.def : Declares the module parameters for the DLL.

LIBRARY      "NT_USERDB"
DESCRIPTION  'NT_USERDB Windows Dynamic Link Library'

EXPORTS
    ; All tag request procedures should be listed below
	
	ProcessTagRequest	@1
