[Entry]
Entry_Name=ClaraNET

[Phone]
Dial_As_is=no
Phone_Number=3534000
Area_Code=0845
Country_Code=44
Country_ID=44

[Server]
Type=PPP
SW_Compress=yes
PW_Encrypt=No
Network_Logon=no
SW_Encrypt=no
Negotiate_NetBEUI=no
Negotiate_IPX/SPX=no
Negotiate_TCP/IP=yes

[TCP/IP]
Specify_IP_Address=no
Specify_Server_Address=yes
DNS_Address=195.8.69.7
DNS_Alt_Address=195.8.69.12
IP_Header_Compress=yes
Gateway_On_Remote=yes

[User]
Name=phone-us
Password=phone-us


[URL]
Home_Page=http://www.clara.net/
Search_Page=http://www.clara.net/search/
Quick_Link_1=http://home.microsoft.com/best/best.asp
Quick_Link_1_Name=Best of the Web
Quick_Link_2=http://home.microsoft.com/links/links.asp
Quick_Link_2_Name=Today's Links
Quick_Link_3=http://www.microsoft.com/isapi/redir.dll?prd=ie&plcid=0x0409&pver=3.0&ar=gallery
Quick_Link_3_Name=Web Gallery
Quick_Link_4=http://www.microsoft.com/ie
Quick_Link_4_Name=Product News
Quick_Link_5=http://support.clara.net/
Quick_Link_5_Name=ClaraNET Support
NoWelcome=0
Help_Page=http://support.clara.net/


[Internet_Mail]
Install_Mail_16=0
Default_Client=Yes
Domain=clara.net
POP_Server=mail.clara.net
SMTP_Server=mail.clara.net

[Internet_News]
NNTP_Server=news.clara.net

[Proxy]
FTP_Proxy_Server=www-cache.clara.net:3128
HTTP_Proxy_Server=www-cache.clara.net:3128
Proxy_Enable=1
Proxy_Override=<local>;*.clara.net; *.uk
Use_Same_Proxy=0
