Copyright: Copyright © 1996-1997 G&A Imaging Ltd.


Cancel

Cancels the current operation.


Contents

I pressed ENTER during my slide show, and now I'm here. Why?

Reset the slide show options and start the presentation


Help

Displays help on this dialog box.


I pressed ENTER during my slide show, and now I'm here. Why?

PhotoRecall Slide Show is a utility that operates in the background while your slide show is being presented. When you pressed ENTER, the slide show was "minimized" (that is, it was previously running as a "maximized" or full-screen presentation, but you reduced it to fit within the Slide Show application window).

A slide show is minimized so that you may reset its presentation options. You can also run the minimized slide show within the utility's application window, if you need to work in other software programs while your pictures are being displayed.


OK

Accepts your changes. To start an automatic slide presentation, click on the Start button in the tool bar. To start a manual slide presentation, click on the First, Previous, Next, or Last Picture buttons in the tool bar.


Reset the slide show options and start the presentation

To reset the slide show options

1.	Choose the Options command from the Show menu; or click on the Options button in the tool bar.

 the Options button

The Slide Show Options dialog box displays.

2.	Set your slide show options, and press the OK button.

To start the presentation

1.	If you choose to manually advance from one picture to the next, you can do so by clicking on the First, Previous, Next, or Last Picture buttons in the tool bar.

 First Picture

 Previous Picture

 Next Picture

 Last Picture

2.	To start an automatic slide show, click on the Start Slide Show button in the tool bar.

 Start Slide Show

3.	To stop an automatic presentation, click on the Stop Slide Show button.

 Stop Slide Show

4.	To maximize the slide show (that is, to run it as a full-screen presentation), click on the Maximize button at the top right-hand corner of the application window.

 Maximize


Show the next picture

Choose whether you want the slides to advance automatically or manually. If you select the automatic mode, enter the number of seconds that the system should wait before advancing to the next picture. If you want the automatic slide show to repeat itself upon completion, choose the "Auto-repeat" option.


Slide Show Options dialog box

Click on the areas of the dialog box (below) to learn more about what it does:

See also

Reset the slide show options and start the presentation