Copyright: Thursday, October 07, 1999 10:40:26


This button adds the user principal name (UPN) suffix in Alternative UPN suffixes to the list below. To add an alternative UPN suffix, type the new UPN suffix in Alternative UPN suffixes and click this button..


This button transfers the domain naming master role to the currently selected domain controller.


Removes any user principal name suffixes in the list. Select a user principal name in the list and click Remove.


Type the alternative user principal name in this space and click Add to add a new alternative user principal name.


This is the current domain controller for the domain.


Specifies the domain controller to which Active Directory Domains and Trusts is currently connected. Click Change to transfer the domain naming master role to this domain controller.

To connect to a different domain controller, right-click Active Directory Domains and Trusts and click Connect to Domain Controller.


Specifies the name of the domain controller currently acting as the domain naming operations master.


Enter the fully qualified name of a domain controller in this space to designate it as the current domain controller.


This list displays all user principal name suffixes currently allowed to log on to the network.


This option allows you to select any domain controller to become the current domain controller.


This option allows you to specify the domain controller you want to have as current focus, by typing the fully qualified name in the space.