Copyright: Copyright © PhatWare Corp. All rights reserved.


Cancel
Closes this dialog box without saving any changes you have made.


Color
Choose the default note color. This color will be used when a new note is created in Microsoft Outlook.


Contents
HPC Notes synchronization module for Microsoft Outlook

HPC Notes 3.0

Copyright © 1997-1999 PhatWare Corp.

All rights reserved.

HPC Notes synchronization module for Microsoft Outlook 9X and 2000.

Configuration utility Help.

To get help for each dialog box item click help button [?] in the dialog box title bar and then click on the desired item.


Custom Outlook Profile
Click here to select a logon profile that will be used every time when you access Outlook personal folders.


Default Outlook Profile
Click here to use the default Microsoft Outlook logon profile to access Outlook personal folders when importing or exporting notes.


Folder
Click here to choose Microsoft Outlook synchronization folder for HPC Notes. By default HPC Notes synchronizes with the default Notes folder. You may select any other Outlook folder, such as another notes folder or Inbox folder. If you change the synchronization folder while the mobile device is connected to the desktop PC, Windows CE synchronization services will be automatically restarted. You may be prompted then for the method of synchronization.


Logon Profile Password
Enter the password for the selected logon profile (if required).


Logon profile
Click here to select a default Microsoft Outlook logon profile. This may be useful if you have multiple Outlook logon profiles with different settings and access rights.


Note password
Click here to specify a password for the protected notes. Only notes that match this password will be synchronized. You can specify up to 3 passwords, if you use different passwords to protect your notes on mobile device.


OK
Closes this dialog box and saves any changes you have made.


Outlook Folders
Choose Microsoft Outlook synchronization folder for HPC Notes. By default HPC Notes synchronizes with the default Notes folder. You may select any other Outlook folder, such as another notes folder or Inbox folder. If you change the synchronization folder while the mobile device is connected to the desktop PC, Windows CE synchronization services will be automatically restarted. You may be prompted then for the method of synchronization.


Password
Click here to specify a password for the protected notes. Only notes that match this password will be synchronized. You can specify up to 3 passwords, if you use different passwords to protect your notes on mobile device.


Profiles
Select a logon profile to access Microsoft Outlook personal folders.


Size
Choose the default note size. This size will be used when a new note is created in Microsoft Outlook.

Small: 	150 X 100 pixels

Medium:	200 X 200 pixels

Large:	450 X 300 pixels


Skip protected notes
Click here to skip all the protected notes during synchronization.


Subject
Microsoft Outlook interprets the first line of the note as a subject. Check this box to add the subject to the note's body during synchronization. If subject matches the first line of the note's body, this option has no effect.


Sync protected notes
Click here to synchronize protected notes. You may specify a up to 3 different passwords. Only notes that match one of these passwords will be synchronized. Protected notes that do not match any of these passwords will be skipped. If this option is not selected all the protected notes will be skipped during synchronization.


Synchronize Now
Click this button to re-synchronize all items, including notes, contacts, files, etc. If your mobile device is not connected or ActiveSync synchronization manager is not running, an error message will be displayed.