FBHFkÉ î'H ┌────────────────────┐
 │  Help Topic INDEX  │
 └────────────────────┘
7
  Use the ARROW keys to scroll through these screens.
5
 <<  Use the TAB key to select different topics. >>
e
  General Help Categories:
  ------------------------
  Topic Index
  Help on Help
  About PRO-Plus
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- dεⁿ'T ┌────────────────────────┐
 │    What is PRO Plus    │
 └────────────────────────┘
X
 PRO Plus - Software designed by BBS Professionals,
            for BBS Professionals.
'
 See Also: Forbes Development Company
^
 What PRO Plus IS:
 -----------------
 The NEW BEGINNING of the ProDoor/ProLogon BBS System.
║
 This FIRST release (and there WILL be more) is just
 an small indication of things to come.  In the near
 future you'll see MAJOR changes in these programs
 as we expand our horizons.
'
    As you've probably seen before...
'
  <<  WATCH FOR MORE IN VERSION 4  >>
4
-------------------------------------------------- ╣'ú ┌──────────────────────┐  There's MORE of this screen!
 │  Help on Using HELP  │  Use the arrow keys to view
 └──────────────────────┘  and scroll these screens.
╚
You can SCROLL this help topic using the ARROW KEYS, or the PgUp and PgDn keys.  If you have a MOUSE, you can use it to scroll the help information by clicking on the up/dn arrows of the scroll bar. 2
 Other TOPICS:
 -------------
    About PRO-Plus
▓
To select another topic, use the TAB keys and then hit the ENTER key to view help on that topic.  Double clicking the left mouse button on a topic will produce the same result. ô
If you have selected another topic, you can use "P" to return to the previous screen (or screens depending on how many topics you have selected). Y
 Other HELP keys:
 ---------------
 A - View information ABOUT the PRO-Plus BBS System.
1
 F - How to contact Forbes Development Company.
p
 H - Help on using the Help system.  The screens you are
     now viewing.  You can also hit F1 for this help.
8
 P - Returns you to the previous help screen (if any).
g
 -->  Hit ESC at anytime to EXIT HELP and return you
     to where you were when you hit F1 for help.
4
__________________________________________________ Å'░             ┌────────────────────────────┐
             │  PRO Plus - The Beginning  │
             │  Copyright (c) 1992-1993   │
             └────────────────────────────┘
u
              Forbes Development Company
                   7112 FM 1960 East
                 Humble, Texas  77346
\
       Voice:  (713) 852-7486, M-F, 10-6, CST
         FAX:  (713) 852-7489, 24 hrs. a day
\
       BBS:  852-4541, 2400 baud, FREE Access
             852-4543, 38.4, Subcribers ONLY
4
-------------------------------------------------- '₧ ┌────────────────────┐  Use the ARROW keys to SCROLL
 │  Help Topic INDEX  │  through these HELP Topics.
 └────────────────────┘  Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
┴
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╩_╠ê═▓╙╤╥╬*	╧U╨z╤ƒ'ÿ ┌──────────────────┐  Use the ARROW keys to SCROLL
 │  Help - INSTALL  │  through these HELP Topics.
 └──────────────────┘  Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
5
  Shows what the Install program will do
  for you.
ÿ
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╩╠Ä═╕╙╫╥╬0	╧[╨Ç╤Ñ'ÿ ┌──────────────────┐  Use the ARROW keys to SCROLL
 │  Help - PRICING  │  through these HELP Topics.
 └──────────────────┘  Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
[
  Gives Pricing information on this first
  release, subscription rates for the BBS, etc.
ù
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╠╩┤═▌╙ⁿ╥0╬U	╧Ç╨Ñ╤╩'ÿ ┌─────────────────┐   Use the ARROW keys to SCROLL
 │  Help - FORBES  │   through these HELP Topics.
 └─────────────────┘   Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
c
  Shows how to contact Forbes Development Company
  in case you need help, more information, etc.
ó
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	═╩╝╠σ╙╥C╬h	╧ô╨╕╤▌'₧ ┌────────────────────┐  Use the ARROW keys to SCROLL
 │  Help: Run INSTALL │  through these HELP Topics.
 └────────────────────┘  Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
b
  Shows you how to Run the INSTALL.EXE program,
  and how to install the INSTALL program itself.
ì
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╙ ╩┴╠Ω═╥3╬X	╧â╨¿╤═'₧ ┌───────────────┐       Use the ARROW keys to SCROLL
 │  Help - UNDO  │       through these HELP Topics.
 └───────────────┘       Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
d
  Shows you the necessary steps to take to UnDO the
  the upgrade and go back what you had before.
£
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╥8╩├╠∞═╙5╬i	╧ö╨╣╤▐'₧ ┌────────────────────┐  Use the ARROW keys to SCROLL
 │  Help - WHATS NEW  │  through these HELP Topics.
 └────────────────────┘  Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
`
  Shows Whats New in ProDoor Version 3.5 and
  ProLogon 1.3 since Version 3.44 and Version 1.2
û
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╬	╩┐╠Φ═╙1╥e╧è╨»╤╘'ÿ ┌──────────────┐      Use the ARROW keys to SCROLL
 │  Help - CNF  │      through these HELP Topics.
 └──────────────┘      Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
S
  Shows all the new variables found in PROLON.CNF,
  what they do, defaults, etc.
£
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  SETS      New SETS used by ProDoor
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╧5╩¼╠╒═ ╙╥R╬w	╨ó╤╟'ÿ ┌───────────────┐     Use the ARROW keys to SCROLL
 │  Help - SETS  │     through these HELP Topics.
 └───────────────┘     Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
╗
  Shows all the SET variables that
  ProDoor and ProLon will use if they are found in
  your environment.  Includes OLD and NEW, and those
  set when ProDoor/ProLon drops out to a door.
£
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  @$        New @$ Variables for ProDoor/ProLon
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╨╩╠=═g╙å╥║╬▀	╧
╤/'ñ ┌──────────────────────┐  Use the ARROW keys to SCROLL
 │  Help - The @$ Vars  │  through these HELP Topics.
 └──────────────────────┘  Your MOUSE will also work.
m
 << Hitting a ENTER key pulls up any HILITED topic >>
 <<   Use the TAB key to SELECT different topics   >>
J
  Shows ALL the @$ variables for ProDoor/ProLon
  including OLD and NEW.
æ
  Other Main Menu Items - INFO Pulldown
  -------------------------------------
  Install   What the INSTALL.EXE will do
  Pricing   Pricing for the First Release
  Forbes    How to contact us.
  Running   How to actually RUN the INSTALL program
  UnDO      How to UN-DO the Upgrade
  Whats New Since ProDoor 3.44, ProLon 1.2
  CNF       New PROLON.CNF Variables
  SETS      New SETS used by ProDoor
X
  -->  Hit P to return to the PREVIOUS screen.
  -->  Hit ESC at anytime to EXIT HELP.
4
-------------------------------------------------- 	╤#╩»╠╪═╙!╥U╬z	╧Ñ╨╩'N ┌────────────────┐
 │  HELP:  SHELL  │  Help Topic Index
 └────────────────┘
ç
 Allows you to quickly DROP to DOS using a DOS SHELL.
 Once in DOS, type the DOS command EXIT to return to
 the Installation program.
6


__________________________________________________ d*'K ┌───────────────┐
 │  HELP:  EXIT  │  Help Topic Index
 └───────────────┘
r
 Exits the INSTALL.EXE program and returns you to
 DOS, or where-ever you were when you started the
 program up.
6


__________________________________________________ d('
~ ┌────────────────────┐
 │  Option:  INSTALL  │
 │  What it will do.  │   See Also: Using INSTALL.EXE
 └────────────────────┘

 First of all, the same INSTALL.EXE program will work
 for ALL the new ProDoor/ProLON files including the
 OVERLAY version of ProDOOR.  The INSTALL program
 will automatically detect what is available for
 installation, and then adjust its menus accordingly.
`
 If you go through the installation and decide you'd
 rather go back to the old way, see UNDO.
ì
 You don't have to use the INSTALL program for the new
 software, but it does do a LOT of the grunt-work
 required to install the programs.
f
 If you'd rather do it the hard way, and go through the
 normal sysop pains, see MANUAL INSTALLATION
µ
 If you let INSTALL do it for you, it will:
 ------------------------------------------
   1.  Optionally creates backups of your existing
       ProDoor/Prolon related files including any
       existing overlay files if found.
÷
       All backups are left in the SAME directory as
       they were found so you can easily "un-do" the
       upgrade.  The last character of the file ext.
       will be changed to a _.  ie.  PRODOOR.EX_
       PROLON.EX_, PRODOOR.OV_, etc.
b
   2.  Copies the new .EXE (and OVR) files to your
       existing ProDoor/Prologon directories.
<
 When the installation program is completed, you can
 immediately run the new versions.  If you decide you
 do NOT want some of the new features, you can DISABLE
 them using SETS and, adding and resetting the CNF
 variables in PROLON.CNF.   See the SETS and CNF help
 items for more info on DISABLING new features.
4
__________________________________________________ ╙U╥▌╦┬'o ┌───────────────────────────┐
 │  Option:  Manual Install  │  Help Topic Index
 └───────────────────────────┘
╒
  It's a LOT easier if you let INSTALL.EXE do the grunt
  work for you (making all the backups, copying the new
  files, etc), but if you wanna do it the "ole sysop way"
  then these are the steps you must take.
╫
  ProDOOR Version 3.51  <-- Make ALL your backups FIRST!
  -------------------.
    1.  Unzip and copy the new PRODOOR.EXE (and OVR if
        using the OVERLAY version) to your existing
        ProDOOR directory.
ù
    If you are upgrading from the Pre-Release 3.50,
    you can remove ALL but one of those "SETS" required
    by the pre-release version.  Read on.
π
    2.  If you have MULTI-NODE, and want to monitor
        SYSTEM usage for ALL nodes, you need to have
        one SET in where-ever file you now have your
        other "SETS" in.
        SET USAGE_FILE=C:\PCB\PROSTATS.DAT
á
        You can "set" it to any file, any path, you want
        but it MUST be the same for ALL nodes if you
        expect it to keep track of ALL activity.
Æ
    If you want to DISABLE any new feature, or do not
    want to use the DEFAULTS, you will have to use more
    "SETS".  See the info on SETS.
»

  ProLON Version 1.31  <-- Make ALL your backups FIRST!
  -------------------
    1.  Unzip and copy the new PROLON.EXE file to the
        same place your existing one is.
l
   If you are upgrading from the Pre-Release 1.30,
   you can leave all your existing CNF variables as is.
Æ
   Thats really all there is to it.  Once you have done
   all of the above, you are ready to run.  Just fire
   up your BBS like you always do.
4
__________________________________________________ d@╨┬'Z ┌────────────────────┐
 │  Option:  PRICING  │  Help Topic Index
 └────────────────────┘
V
 This FIRST release of the NEW ProDoor/Prolon programs
 is FREE, zip, nada, nothing.
╤
 Call it a form of introducing ourselves, an indication
 of our coding style, an indication of what is still
 "yet to come", and our general programming emphasis.
 (Lots of SYSOP stuff huh??  Got the idea??)
╘
 If you feel you'd like to pay something anyway, then
 call my BBS at (713) 852-4541 and donate a one-years
 subscription.  Until 03/15/93, the rate for registered
 ProDoor/Prolon sysops is a flat $20 per year.
q
 Obviously not a lot for the amount of work this takes,
 but it's not the amount, it's the thought that counts.
=
 See FORBES for a complete phone list and
 mailing address.
4
__________________________________________________ d2══'░             ┌────────────────────────────┐
             │  PRO Plus - The Beginning  │
             │  Copyright (c) 1992-1993   │
             └────────────────────────────┘
u
              Forbes Development Company
                   7112 FM 1960 East
                 Humble, Texas  77346
]

       Voice:  (713) 852-7486, M-F, 10-6, CST
         FAX:  (713) 852-7489, 24 hrs. a day
\
       BBS:  852-4541, 2400 baud, FREE Access
             852-4543, 38.4, Subcribers ONLY
4
__________________________________________________ '$` ┌──────────────────────┐
 │  Option:  Whats NEW  │  Help Topic Index
 └──────────────────────┘
Ñ
  Related Topics:
  ---------------
  New CNF (PROLON.CNF) Variables
  New SET environment variables used by ProDoor
  New @$ Variables used by both ProDoor/ProLon
c
  There are a LOT of changes, the major ones follow, the
  rest are listed in the WHATS.NEW file.
Σ
  New ProDOOR command:  <-- New since 3.50
  --------------------
  Ever wanted to get on a node and not let everyone know
  you were on ??  Type SILENT once in ProDoor and bingo,
  you ain't there !!  Type NODE to confirm it.
▐
  NOTE:  This is security-level sensitive... only those
  with security level = 100 or higher can use it.
  However, as a sysop, you can type it on the command
  line for ANY caller, regardless of their security
  level.

  New ProDoor/ProLogon F Keys.  <-- New since 3.5/1.3
  ---------------------------
  I really missed the F1 for Temp-Sysop privledges.
  Missed the Right/Left arrows for temporarily changing
  a caller's security level too. I don't miss them now !
  Yep, they be here!!
}
  You can use these keys from ProLon or ProDoor.
  Nice in ProLogon to qwikly force a caller into
  a different login door.
¼
  NOTE:  Unless you hit the F1 for Temp-Sysop, the
  caller's security will return to normal if they
  exit to a door, and then return to ProDoor.
  (Security reasons...)
╓
  Call-Waiting Screen:
  --------------------
  The very first thing you will see in PROLON is the
  new call-waiting screen - assuming of course that
  you "activated" this new feature in your PROLON.CNF
  file.
e
  KEYS:  PgDn - toggles between NODE and SYSTEM Usage.
         Z - will RESET usage stats to ZERO.
╦
  I have heard one sysop say that the VERY first time
  he ran the new PROLON.EXE, the "usage-stats" were
  all outta whack.  No problem.  Just hit the Z key
  and everything will be fine from then on.
'
  Expanded DISP- and EXEC- functions
  ----------------------------------
  I like using these in PROXMAIN but, would never know
  from my caller log if they had been used or run by
  a caller.  I had to use an external program to update
  the caller log before and after the command was used.
²
  Not anymore.  $LOGEXEC- and $LOGDISP- will act just
  like the normal commands, but add the entry to your
  caller log too.  $EXEC- and $DISP- are still there
  but if you want to see usage of those commands, add
  the word LOG to the front of them.
3
  Sysop Macros Keys <-- Before, just F8, now ADD 10 !
  -----------------
  The Sysop Macro keys (10 of them) found in PcbSetup
  (Options 2) have been expanded.  You can now put
  $DISP- and yep, $EXEC- in the macros.  Great for
  "hot-keying" a caller into a door, or DISP-ing an
  ASCII screen at them.
è
  Example:  <-- See OPTIONS 2 in your PcbSetUp !
  --------
  Shift F1  $DISP-D:\PCB\VIOLATE   to dump a file to
            the screen.
d
  Shift F2  $EXEC-D:\PCB\DOORS\VERIFY.BAT to throw
            them in to a call-back verify door.
ò
  NOTE:  Your $DISP- file can even contain the new
         @LOGOFF@ variable and when that file is
         "DISP-ed"... yep, it'll dump the user.
¥
  Shift F8  $DISP-D:\PCB\BuzzOFF  with a @LOGOFF@
            as the last thing in the "BuzzOFF" file.
            He'll see the file, and then get dumped.
I

  Strict Command Interpetation  <-- If activated
  ----------------------------
  New in 3.51.  If this is set to ON (default), the
  system will keep track of command line errors and
  dump the caller if they make more than 10 during
  any one call.  Nice if someone is just hitting
  keys trying to find some SYSOP only key.
╓
  Now... on the STRICT COMMANDS ON
  I use to hate it when I was "chatting" on the command
  line and typed something like... GREAT, LETS TALK !!
  only to have the caller logged off... the "G" would
  do him in.
ö
  Not anymore... if you set STRICT commands on, the
  GREAT example won't dump them off the BBS.  And even
  more... you can set the "bad command" to display a
  message to the caller, you can have it ignored and
  just return to the command prompt.... and you can
  even have the "bad command" logged to your caller
  log.  All of these are SET-ABLE by you.  See the
  SET commands for more info here.
²

  Force Message Scan
  ------------------
  You can now force it, in a number of ways.
  If you have it forced to MAIN (default), the caller
  will be asked if they would also like to scan ALL
  conferences.
  See the new CNF variables for more info.
D
  Allow Duplicate Uploads
  -----------------------
  Must be a zillion times I (as the sysop) wanted to
  upload a file, and replace the one on the BBS with a
  new version, but couldn't because there was already
  one there with the same name.  Now you can over-ride
  it if you want (and you have high enough security).
?
  Increased Security for DISP- Usage  <-- New
  ----------------------------------
  In ProDoor 3.5, I temporarily removed the DISP
  function when displaying DIRx or UPLOAD files.
  Could be very "dangerous" if it was in the wrong
  place (like a file DESCRIPTION).  Now it's back,
  but with MORE reliable security.
Ö
    - When viewing ANY dirx listing, if a DISP is
      found past column 30, it will be ignored and
      an entry will be recorded to the caller log.
#
    - There is a new SET that you can use to have
      even MORE protection.  SET MAX_DISP_LOC=30
      (Default=30).  When using this SET, any DISP
      that occurs past column 30 of the screen, will
      be ignored, and an entry recorded in the caller
      log (to help you find it).
ü
  Bug Fixes
  ---------
  Ansi messages getting reset to default colors on
  every line.... broken again in 3.5, fixed in 3.51.
e
  DIR listings getting reset to defaults if the listing
  had embedded color codes in it.... fixed.
æ
  Range check error if using Z or L to locate a file,
  and if WILDCARDS are used, and... if filename was
  longer than 8 characters.... fixed.
₧
  Range check error on ANSI upload into a message if
  number of characters on a line exceeded the max
  of 72 characters.... Brioken in 3.5, fixed in 3.51.
Q
  Remote callers INSERT key not active in Visual edit
  of a message.... fixed.
L
  Problem with $DISP- when in upload/download file
  description... fixed.
S
  Hard disk activity on a blank call-waiting screen
  every 30 seconds.... fixed.
R
  A blanked Call-Waiting screen coming back on during
  a modem reset.... fixed.
V
  .... and a LOT more (see WHATS.NEW), and even LOTS
       more still on the way !!
4
__________________________________________________ d6╧î╨¡╤▌'i ┌─────────────────────────┐
 │  Option:  New CNF Vars  │  Help Topic Index
 └─────────────────────────┘
0
 These new varaiables should be in your PROLON.CNF
 file.  If you like my DEFAULTS, you don't need to
 add them.  However, if you DON'T like my defaults,
 you need to need to ADD THEM yourself, and then
 change each one according to YOUR preferences.
 This list is duplicated in the file called NEWCNFS
x
 SHOW_PLUS OFF     (ON, OFF, Default=OFF)
  ; Some like the "+" on the blank call-waiting
  ; screen, and some do not.
ç
 NEW_PANEL ON     (ON, OFF, Default=ON)
  ; Whether or not to use the NEW call-waiting
  ; screen that shows BBS usage. New Callers,
  ; Messages, Uploads, downloads, etc.
  ; PgDn on the Call-Waiting screen will toggle
  ; between NODE and SYSTEM-WIDE stats.
  ; To get SYSTEM-WIDE usage stats, all nodes
  ; must have the same SET USAGE_FILE= file.
  ; See the SETS for more information.
▒
 FORCE_MSG_SCAN ALL  (OFF, ALL, MAIN, Default=MAIN)
  ; Forces a SCAN MAIN BOARD ONLY or a
  ; SCAN ALL conferences for messages.
  ;
  ; If set to MAIN, the caller will be asked
  ; if they want to SCAN ALL in addition to
  ; the SCAN MAIN.
  ;
  ; If set to OFF, the caller will get the normal
  ; "Scan Main Board for Messages" prompt.
  ;
  ; If set to ALL or MAIN, the caller will NOT
  ; get the prompt... it will be FORCED !
┌
 FORCE_SCAN_COMMAND N  (N, Y, S, Default=N)
  ; The "J ?" command to use when FORCE is on.
  ; ie.    N = J N    Y = J Y   S = J S
  ;        N=NEW      Y=YOUR    S=STATS
  ;
  ; Has the same effect as if the user typed it
  ; on the command line.
  ;
  ; Each of these commands will produce different
  ; results, you should experiment to see which
  ; one you prefer the best.
  ;
  ; I use the "N" for ALL NEW messages and it seems
  ; to do the trick... no more "I LEFT A MESSAGE",
  ; "WHY DIDN'T YOU ANSWER ?"   Heck, I DID !!!
  ;
  ; ... or, he left the message in Conference 3,
  ; and didn't see the response because he never
  ; went back in, and expects it to be in the Main.
  ; He'll see it now.... it is FORCED !!
4
__________________________________________________ d<'
] ┌─────────────────────┐
 │  Option:  New SETS  │  Help Topic Index
 └─────────────────────┘
⌐
 If you are upgrading from the Pre-Release versions,
 and you want to use MY defaults, then you can remove
 ALL of those "required" 3.50 sets EXCEPT for one.
 Read On.
═
 Look at each of the DEFAULTS.  If you don't like mine,
 then you can disable them using the DOS SET command.
 Put the SET commands where-ever your existing ones
 are now (AUTOEXEC.BAT, BOARDx.BAT, etc);
╘
 NOTE:  Again, with the exception of this FIRST set,
 you do NOT need to have ANY of them unless you don't
 like my defaults.  Like the defaults... forget it.
 Don't like the defaults, use the SET to change it.

 set usage_file=prostats.dat      (REQUIRED!!)
    ; The one SET that is REQUIRED if you have multi
    ; node, and want to track usage for ALL nodes.
    ; Name and location of BBS/NODE usage data file
    ; Make it the SAME for ALL nodes if you want to
    ; track SYSTEM usage.
┼
 set max_disp_loc_desc=30  (any number, Default=30)
    ; << NEW since the Pre-Release >>
    ; For improved security with the DISP command,
    ; set this and if a DISP is detected past column
    ; "x", it is ignored and an entry recorded to the
    ; caller log.  Set it to 255 to allow ALL DISP-s.
    ; NOTE:  This number is ignored when listing
    ; file directories... if ANY disp- is detected
    ; past column 30, it is skipped and recorded.
·
 set save_missing_desc=ON  (or OFF, default=ON)
    ; << NEW since the Pre-Release >>
    ; I got tired of having to re-enter a file
    ; description for a file nuked by my upload
    ; checker.  Now it's SAVED in whatever DIRx
    ; listing that iw "would have" gone to had
    ; it been a successful upload.  I figure its
    ; a LOT easier to edit a DIRx file, then it
    ; is to re-enter a zillion descriptions.
    ; This also lets me track callers trying to
    ; upload, but continually failing.
σ
 set show_flow=OFF        (or ON, default=OFF)
    ; First time I saw the word FLOW flashing on my
    ; screen, I thought my modem was wigging out.
    ; It's not a bug but I didn't like it so,
    ; this SET takes care of it.
#
 set see_idle=100    (Security level, Default=100)
    ; Some sysops don't like callers seeing system
    ; idle time... some don't care.  If you don't
    ; care, comment the line out, or set it to 0.
    ; Otherwise, set it to sysop level and then
    ; you'll be the only one seeing it.
╦
 set upload_dups=100   (Security level, Default=100)
    ; Now I as the sysop can duplicate a file that
    ; already exists on the BBS.  (like when trying
    ; to upload a newer version from remote).
╙
 set strict_commands=ON     (ON, OFF, default=ON)
 set show_errors=ON         (ON, OFF, default=ON)
 set log_command_errors=ON  (ON, OFF, default=ON)
    ; For more info on these three SETS, see the
    ; WHATS NEW info.
    ;
    ; NEW since 1.3 and 3.5....
    ; If STRICT is ON, the system will keep
    ; track of bad commands and dump the caller
    ; if they make more than 10 during that call.
    ; Keeps callers from trying to break in to
    ; the system.

 set allow_disp=OFF    (ON, OFF, Default=ON)
    ; Some sysops are a little leary of power of
    ; the $DISP- command.  Set it OFF and the DISP
    ; command will NEVER be interpetted in ANYTHING
    ; Note:  It will still work in PROTRNS and the
    ;   new Sysop Macro Keys.
4
__________________________________________________ d4'f ┌────────────────────────┐
 │  Option:  New @$ Vars  │  Help Topic Index
 └────────────────────────┘
ó
 @SYSTIME2@... New since 1.3/3.5   12:34 PM style.
 @LUSER@...... Upper/Lower case Caller Name
 @HOTKEYS@.... Are they on for the caller? YES/NO
 @CHATPAGE@... Is he available for CHAT?  YES/NO
 @EARNBYTES@.. Earned DL Bytes
 @LOGOFF@..... The NEAT one.. dumps caller.
               Stick this in ANY listing... DIRx,
               Bulletins, whatever, and when the
               caller hits it, he's outta there.
P
 I really like using the @ variables so... Look for
 a LOT more in the future.
4
__________________________________________________ d:'T ┌──────────────────┐
 │  Option:  UN-DO  │  Help Topic Index
 └──────────────────┘
	
  Un-Doing the upgrade should be simple.  Just copy ALL
  of your backups (you did make some didn't you?) on
  top of the new upgrades.  Don't forget to remove
  any new SETS you might have added, or any new CNF
  variables that were added to the PROLON.CNF file.
X
  In a nutshell....
  -----------------
     1.  Copy all old .EXE and OVR files back.
b
     2.  Edit your BOARDx.BAT file and remove any of
         the new SET environment variables.
h
     3.  Edit your PROLON.CNF files and remove ALL
         of the NEW CNF variables.  (See the NOTE!)
c
  NOTE:  Leaving the new SETS will do NO HARM other
   than use up unnecessary environment space.

   The new CNF variables however WILL cause problems!
   When your old PROLON.EXE file sees the new variables
   it will IMMEDIATELY come to a halt, telling you it
   saw some "UnRecognized Keywords" in PROLON.CNF.
   (We kinda expected that.... right ??)
4
__________________________________________________ d.'	p ┌────────────────────────────┐
 │  Option:  Running INSTALL  │  See Also USING
 └────────────────────────────┘
∞
 The same INSTALL.EXE program will work for ALL the
 the new ProDoor/ProLON files including the OVERLAY
 version of ProDOOR.  The INSTALL program will detect
 what is available for installation, and then adjust
 its menus accordingly.
┴
 To install the INSTALL program:
 -------------------------------
    Create a SEPARATE directory and put ALL of the
    new files (including INSTALL.EXE) in that newly
    created directory.
┌
 TWO Ways to RUN the INSTALL.EXE program:
 ----------------------------------------
   1. CD to where your existing ProDoor or ProLON
      files are, and run INSTALL.
      ie.  CD\PCB
           C:\NEWSTUFF\INSTALL
L
   2. or... first CD to the INSTALL directory and
      then type INSTALL.
ƒ
 In BOTH cases, INSTALL will search your path for
 what it thinks are your existing files.  You will
 be able to change what it found, to what it should
 be.
╚
 NOTE:
 -----
 You can run the INSTALL.EXE from ANY drive, or
 ANY directory.  The only thing required is that
 ALL of the new ProDOOR and ProLON files MUST be
 in the same directory as INSTALL.EXE.

 When INSTALL runs, it will check to make sure
 all the neccessary files are there.  If so,
 all is well.  You'll be told if one or more
 files are missing.  If the INSTALL_.HLP file
 is missing, INSTALL will still run, but you
 won't have access to ANY HELP/INFO data.
4
__________________________________________________ ╩K'W ┌─────────────────────────┐
 │  Item:    BACKUP First  │
 └─────────────────────────┘
>
 Related Topics:
 ---------------
 What the INSTALL will do.
è
 If you answer Y to this item, INSTALL will make a
 backup of that particular file(s) before making the
 upgrade to your existing files.
»
    Old file           Backup File
    -----------        -----------
    PRODOOR.EXE        PRODOOR.EX_
    PRODOOR.OVR        PRODOOR.OV_
    PROLON.EXE         PROLON.EX_
4
__________________________________________________ ╩à'` ┌────────────────────────────┐
 │  Item:   UPGRADE Existing  │
 └────────────────────────────┘
ä
 Related Topics:
 ---------------
 Creating BACKUPS First.
 What the INSTALL will do.
 What's NEW in ProDOOR 3.51 and PROLON 1.31.
▌
 If you answer Y to this item, INSTALL will copy the
 new version files to your existing ProDoor/ProLON
 directories.  If you selected the BACKUP FIRST option,
 it'll make backups of your files before it does the
 copy.
┘
 If you are installing an OVERLAY version of ProDoor,
 the PRODOOR.OVR is copied (and backed up) at the same
 time as the EXE.    ie.  Do the EXE file, the OVR
 file gets it too.  No additional entries are required.
4
__________________________________________________ ╘Ä╩º╬└'T ┌────────────────────────┐
 │  Item:    PRODOOR.EXE  │
 └────────────────────────┘
W
 Related Topics:
 ---------------
 Creating BACKUPS First.
 What the INSTALL will do.
H
 Enter the FULL path/name of the existing PRODOOR.EXE
 to be upgraded.
 
 Example:  C:\PROD\PRODOOR.EXE
┤
 If you are installing an OVERLAY version of ProDoor,
 the PRODOOR.OVR is copied (and backed up) at the same
 time as the EXE.    ie.  Do the EXE file, the OVR
 file gets it too.
4
__________________________________________________ ╘é╩¢'Q ┌───────────────────────┐
 │  Item:    PROLON.EXE  │
 └───────────────────────┘
ä
 Related Topics:
 ---------------
 Creating BACKUPS First.
 What the INSTALL will do.
 What's NEW in ProDOOR 3.51 and PROLON 1.31.
O
 Enter the FULL path/name of the existing PROLON.EXE
 that will get upgraded.
o
 Example:  C:\PCB\PROLON.EXE
           F:\PCB\NODE3\PROLON.EXE
           D:\PROD\PROLON.EXE
           etc.
4
__________________________________________________ ╘╩ÿ╬▒'▄    ╪hC	                                                                                                                                                                                                                                                                                                                                                                                            i    ªn        I        ≡!┬%ç)┤-        q1É2                                                                                                                                                                                                                                                                                                                                            ù3M:&AéD⌐F▀`Vi∙v£y╓}Θâå≈êï                