Below you will find two list boxes. The left box is a list of all systems configured to run under PCB Freedom. The right box is the current dialing list.
To add a system to the Dial List, click on the entry in the left box. To remove a system from the Dial List, click on the entry for it in the right box.
If you want Freedom to dial the list in a minimized state (i.e. in the background), check the Dial minimized ? checkbox.
To pre-set a time for Freedom to make it's runs every day, enter the desired time in the Dial time : editbox. The time must be in 24 hour format, and contain all digits, including leading zeros (i.e. 6 AM is 06:00 in the box, 11 PM is 23:00).
When the Dial List is configured to your liking, click on the Done button to save it and exit the Dial List Control routines, or click on the Dial button to save the settings, and immediately begin the dialing routines.
