
  -------------------------- cFos Command Overview ---------------------------

    ?      This help
    A      Force Answer
    Bn     Protocol for outbound call: 0=X75, 1=V110 38k4, 2=V110 19k2,
           4=Elink, 5=Btx, 6=Btx w/VT-100, 7=analogue modem
    D..    Dial a number, l=last, f=leased line, v=spv
    En     Command Echo (0=off, 1=on)
    Hn     0=Terminate call, 1=Reject call
    In     Inquiry, n=0,1,2,4[,5]
    Qn     Quiet mode: 1=suppress results
    Sr=n   Set register r to value n
    Sr.b=n Set bit b in register r to n
    SrH=n  Set high byte of reg r to n
    SrL=n  Set low byte of reg r to n
    Sr?    Query register r
    Vn     0=numeric, 1=verbal results
    Xn     Result codes: 0=min, 9=max
    Zn     Reset and read profile n from disk

    &Bn    Bundling: use n b-channels for next outbound call {+}
    &Dn    status line: 1=on if port is init'ed, 2=on when calling/called
    &En    Source EAZ
    &F     reset to Factory defaults
    &Gn    Accumulated costs mgmt: 0=show, 1=clear
    &H<S>  Set hangup-sequence to "+++<S><cr>"
    &I..   Listen to service: a=analog, d=digital
    &Kn    Inband-negotiation (required for V.42b): 0=off, 1=on
    &L..   Listen to EAZs: 0-9, *=all
    &Mn    Bundling mode: 0=static, 1=dynamic
    &O..   Set Outdial number
    &Rn    Reregister at CAPI; 1=force even if connections active
    &T     set clock to Tranxed time
    &V     View profile
    &Wn    Write profile to number n on disk

    S0     0=manual, 1 or more=auto answer after S0'th "RING"
    S1     Ring count
    S6     Column of callerid display (see s11)
    S7     Secs to wait for connection
    S9     Bitmapped register:
           .0      enable any further result code
           .1      enable "CONNECT <rate>", otherwise "CONNECT 9600"
           .2      enable "RINGING"
           .3      enable "RING <number>"
           .4      enable /X75.. after "CONNECT"
           .5      enable "ERROR/<cause>"
           .6      enable "NO CARRIER/<cause>"
           .7      enable /V42B after "CONNECT"
    S10    Bitmapped register:
           .0      enable "CONNECT.../ID=<callerid>"
           .1      disable full status line, just display the callerid
           .2      display service indicator & add. si numerical
           .3      display "RING 1234..." instead of "RING<cr>ID=..."
           .4      enable +++ATH0<CR> hangup sequence in BIOS emulator mode
           .6      disable multiple CallerID's
           .7      display S47 as baudrate on "CONNECT" messages
           .8      reject calls with no CallerID
           .9      enable 'Audible RING'
    S11    Status linenumber
    S12    Nummer of 1/18 sec. to wait before "CONNECT" message.
    S13    Serviced EAZ Mask
    S14    Serviced SI Mask
           .0      videophone             .7      data (64 kbits/s)
           .1      telephone              .8      X.25-services
           .2      a/b-services           .9      teletex 64
           .3      X.21-services          .10     mixed mode
           .4      telefax (Group 4)      .15     BTX (new standard)
           .5      BTX (64 kbits/s)
    S16    Service Indicator
    S17    Add. Service Indicator
    S18    Source EAZ
    S19    Inactivity timer in mins, 0=disabled
    S20    B2 protocol
    S21    B3 protocol
    S22    B2 framelength
    S26    B2 window size
    S27    V110 user rate
    S28    max B2 Framelen for send
    S29    B3 protocol overhead
    S40    Controller
    S43    Default V110 user rate & Protocol
    S44    Audio Mode for incoming calls: 0=Voice, 1=Analogue modem
    S45    X.25 / X.31 delivery confirmation
    S46    X.25 / X.31 group/channel
    S47    Baudrate to return on "CONNECT", if S10.7=1
    S48    Suppress the first <s48> "RING"s.
    S49    Number of digits of caller-id to ignore when called with CCB
    S50..59  Default Add. Serv. Indicator and B2-Protocol for every EAZ
    S60    Charge limit, main port
    S61    Charge limit, aux. port
    S62    Time limit, main port
    S63    Time limit, aux. port
    S64    Lower cps limit
    S65    Upper cps limit
    S66    Charge simulation timer
    S67    Pre-off disconnect time
    S68    Connect tries
    S69    Delay between dyn. CCB tries
    S70    Cost of one charging unit
    S71    Charging units * S70 % 100
    S72    Charging units * S70 / 100
