[Overview]
Name=Germany
AreaCode=
TimeZone=GMT+01:00
DaylightSavings=True
CountryCode=49
CountryName=
TimeZoneName=Berlin, Germany

[Defaults]
LocalPrefix=None
LocalSuffix=None
LongDistancePrefix=1
LongDistanceSuffix=None
DisableCallWaitingNumber=*70
DisableCallWaiting=False
ModemPort=
InternationalPrefix=00
DialFormat=0%A%N,,,,%C%S
LongDistanceDialFormat=0%A%N,,,,%C%S
InternationalDialFormat=00%D%A%N,,,,%C%S

[MPTCPIP]
AccessMethods=AM1

[AM1]
Provider=CDROM Katalog
Name=CDROM Katalog
QWinsock=False

