
  -------------------------- cFos Command Overview ---------------------------

    A      force Answer
    Bn     protocol for outbound call: 0=X75, 1=V110 38k4, 2=V110 19k2,
           4=Elink, 5=Btx
    D..    Dial a number, l=last
    En     command Echo
    Hn     0=terminate call, 1=reject call
    In     Inquiry, n=0,1,2,4
    Qn     Quiet mode: 1=suppress results
    Sr=n   Set register r to value n
    Sr.b=n Set bit b in register r to n
    SrH=n  Set high byte of reg r to n
    SrL=n  Set low byte of reg r to n
    Sr?    query register r
    Vn     0=numeric, 1=verbal results
    Xn     Result codes: 0=min, 9=max
    Zn     Reset and read profile n from disk

    &Bn    Bundling: use n b-channels for next outbound call {+}
    &Dn    status line: 1=on if port is init'ed, 2=on when calling/called
    &En    Source EAZ
    &F     reset to Factory defaults
    &H<S>  Set hangup-sequence to "+++<S><cr>"
    &L..   Listen to EAZs: 0-9, *=all
    &O..   set Outdial number
    &Rn    Reregister at CAPI; 1=force
    &T     set clock to Tranxed time
    &V     View profile
    &Wn    Write profile to number n on disk

    S0     0=manual, 1=auto answer
    S7     secs to wait for connection
    S9     bitmapped register:
           .0      enable any further result code
           .1      enable CONNECT <rate>, otherwise CONNECT 9600
           .2      enable RINGING
           .3      enable RING <number>
           .4      enable /X75.. after CONNECT
           .5      enable ERROR/<cause>
           .6      enable NO CARRIER/<cause>
    S10    bitmapped register:
           .0      enable CONNECT.../ID=<callerid>
           .1      disable full status line, just display the callerid
           .2      display service indicator & add. si numerical
           .3      display RING 1234/EAZ1/07/00
           .4      enable +++ATH0<CR> hangup sequence in BIOS emulator mode
           .5      enable CallerID zero padding
           .6      disable multiple CallerID's
    S11    Status linenumber
    S12    Nummer of 1/18 sec. to wait before CONNECT message.
    S14    Serviced SI Mask
    S16    Service Indicator
    S17    Add. Service Indicator
    S19    Inactivity timer in mins
    S20    B2 protocol
    S21    B3 protocol
    S22    B2 framelength
    S26    B2 window size
    S27    V110 user rate
    S28    max B2 Framelen for send
    S29    B3 protocol overhead
    S40    Controller
    S43    Default V110 user rate & Protocol
    S49    number of digits of caller-id to ignore when called with CCB
    S50..59  Default Add. Serv. Indicator and B2-Protocol for every EAZ
    S60    charge limit, main port
    S61    charge limit, aux. port
    S62    time limit, main port
    S63    time limit, aux. port
    S64    lower cps limit
    S65    upper cps limit
    S66    charge simulation timer
    S67    pre-off disconnect time
    S68    connect tries
    S69    delay between dyn. CCB tries
