VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
  Persistable = 0  'NotPersistable
  DataBindingBehavior = 0  'vbNone
  DataSourceBehavior  = 0  'vbNone
  MTSTransactionMode  = 0  'NotAnMTSObject
END
Attribute VB_Name = "CTimer"
Attribute VB_GlobalNameSpace = False
Attribute VB_Creatable = True
Attribute VB_PredeclaredId = False
Attribute VB_Exposed = True
Dim totalInterval As Double
Dim T1 As Double

Public Sub StartCounting()
    T1 = Time
End Sub

Public Sub StopCounting()
    totalInterval = totalInterval + Time - T1
End Sub

Property Get ElapsedTime() As Double
    ElapsedTime = totalInterval
End Property

Public Sub ResetTimer()
    totalInterval = 0
End Sub

