[ver]
	4
[files]
[charset]
	82
	ANSI (Windows, IBM CP 1252)
[revisions]
	0
[prn]
	HP LaserJet 4/4M PS 600 dpi
[port]
	LPT1:
[lang]
	1
[fldnames]
	Field1
	Field2
	Field3
	Field4
	Field5
	Field6
	Field7
	Field8
[desc]
	8</}>" x 11" Laser Label
	
	
	
	
	792894638
	1
	792894476
	3
	1
	0
	0
	0
	0
	
	
	
	
	
	
	1
[fopts]
	0
	1
	0
	0
	
	
[lnopts]
	2
	Body Text
	1
[docopts]
	5
	2
[GramStyle]
	
[tag]
	Body Text
	2
	[fnt]
		Arial
		360
		0
		16385
	[algn]
		4
		1
		0
		0
		0
	[spc]
		33
		446
		1
		0
		144
		1
		100
	[brk]
		4
	[line]
		8
		0
		1
		0
		1
		1
		1
		10
		10
		1
	[spec]
		0
		0
		
		0
		1
		1
		0
		0
		0
		0
	[nfmt]
		280
		1
		2
		.
		,
		$
	Body Text
	0
	0
[lay]
	Standard
	641
	[rght]
		15840
		12240
		1
		720
		1440
		1
		720
		720
		0
		1
		0
		1
		0
		2
		1
		720
		11520
		12
		1
		720
		1
		1440
		1
		2160
		1
		2880
		1
		3600
		1
		4320
		1
		5040
		1
		5760
		1
		6480
		1
		7200
		1
		7920
		1
		8640
	[hrght]
	[lyfrm]
		1
		11208
		0
		0
		12240
		720
		0
		1
		3
		1 0 0 0 0 0 0
		0
		0
		1
	[frmlay]
		720
		12240
		1
		1440
		72
		1
		792
		1440
		0
		1
		0
		1
		1
		0
		1
		1440
		10800
		2
		2
		4680
		3
		9360
	[txt]
>
	[frght]
	[lyfrm]
		1
		13256
		0
		14400
		12240
		15840
		0
		1
		3
		1 0 0 0 0 0 0
		0
		0
		2
	[frmlay]
		15840
		12240
		1
		1440
		792
		1
		14472
		1440
		0
		1
		0
		1
		1
		0
		1
		1440
		10800
		2
		2
		4680
		3
		9360
	[txt]
>
[elay]
[edoc]
<:#427,10800>Body Text Style (F4)

<:#427,10800>Type the main portion of your message in this style.

<:#427,10800>

<:#1281,10800>If your label requires a special graphic or text placement, create a frame of the desired size and place all elements for your label within the frame.

>

[Embedded]
00001946
