                             GENERAL HELP


   From the main menu you may press the horizontal arrow keys to
   move to the main menu selection you desire.  Each main menu has a
   number of panels which may be selected by using the up and down
   arrow keys.  Once you have positioned to the panel you desire,
   press the Enter key to make the selection.  Pressing the Esc key
   at the main menu will immediately position you to the EXIT to DOS
   selection.  Pressing the Enter key at this point will leave
   QAPlus.

   Certain Monochrome emulations of color into shades of gray
   yield a highlight that is not visible.  QAPlus will properly
   detect a color monitor.  If you cannot see a highlighted menu bar
   when you start QAPlus, after starting QAPlus, immediately press
   the Right Arrow key once, the Enter key and then the Up Arrow key
   to select Color Off.  This should make the highlight visible.

   The "Press any key" message permits the program to pause to
   permit you to view information.  After you are done, pressing any
   key except the Shift, Caps Lock, Alt, or Ctrl keys will let the
   program continue.

   Pressing the ESC key at any point other than the main menu
   will make the program halt what it was doing and return you to
   the previous menu.  If the Esc key is pressed while the program
   is busy performing tests or printing, it may take a moment before
   it recognizes the Esc request.

   In the Run Tests selection, there are a number of test
   groups.  Within each test group there may be several individual
   tests which may be enabled or disabled.  Use the Up and Down
   arrow keys to move to the test group selected.  If the test is
   enabled, a >> character appears beside the selection.  Use the
   Right and Left keys to position the highlight over the test
   selection you wish to enable or disable and press space bar to
   change the selection.  Pressing the Enter key over any
   highlighted test group initiates those tests.  Pressing the Enter
   key at the bottom selection runs all test groups.

                               *** END ***
