; Tools/cdc 2.12 (3 Apr 1997) (OS2/TOOLS)
; CAT Help Emitter $Revision: 1.27 $
; 
; Catalog definitions for module "Screen" (Screen.Book)
; 
; Original Command Line: 
; 
;    Z:\SCALA\CURRENT\OS2\TOOLS\BIN\CDC.EXE -t -q -n Z:\Scala\Names -i 
;    D:\TMP\XX200.rel\Screen.rls\Locked\XX200\Include;Z:\Scala\Locked\XX200\Include 
;    Screen.cdl -o Screen.cdl.err -e CPublicDoc -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Autodoc\Screen.doc -e 
;    CPrivateDoc -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Autodoc\Internal\Screen.doc 
;    -e CPublicIPF -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Autodoc\Screen.ipf -e 
;    CPrivateIPF -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Autodoc\Internal\Screen.ipf 
;    -e Catalog -c -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Catalogs\Screen.msg -e 
;    Help -c -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Catalogs\Screen.hlp -e 
;    NameDB -l -o 
;    D:\TMP\XX200.rel\Screen.rls\out\Locked\XX200\Names.dat\Screen\Screen.ndb 
;    -e CPublicHead -v -s -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Include\Screen\Screen.h 
;    -e CPrivateHead -v -s -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Include\Screen\Internal\Screen.ph 
;    -e AsmMSDOS -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\src\Screen\_dos.asm -e 
;    AsmWin32 -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\src\Screen\_win32.asm -e 
;    CModuleCode -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\src\Screen\book.c -e 
;    CModuleHead -o 
;    D:\TMP\XX200.rel\Screen.rls\obj\Locked\XX200\Include\Screen\book.h 
; 
; THIS FILE IS COMPUTER GENERATED, NO HUMAN GENERATED CHANGES ARE PERMITTED
; 
VERSION 3
REVISION 2
LANGUAGE "English"
NATURALNAME "Screen"
