; Tools/cdc 2.9 (7 Feb 1997) (OS2/TOOLS)
; CAT Help Emitter $Revision: 1.27 $
; 
; Catalog definitions for module "ScrTest" (ScrTest.EX)
; 
; Original Command Line: 
; 
;    Z:\SCALA\CURRENT\OS2\TOOLS\BIN\CDC.EXE -t -q -n Z:\Scala\Names -i 
;    D:\TMP\ScrTest.rel\Release.rls\Include;Z:\Scala\Include ScrTest.cdl 
;    -o ScrTest.cdl.err -e CPublicDoc -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\Autodoc\ScrTest.doc -e CPrivateDoc 
;    -o D:\TMP\ScrTest.rel\Release.rls\obj\Autodoc\Internal\ScrTest.doc -e 
;    CPublicIPF -o D:\TMP\ScrTest.rel\Release.rls\obj\Autodoc\ScrTest.ipf 
;    -e CPrivateIPF -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\Autodoc\Internal\ScrTest.ipf -e 
;    Catalog -c -o D:\TMP\ScrTest.rel\Release.rls\obj\Catalogs\ScrTest.msg 
;    -e Help -c -o D:\TMP\ScrTest.rel\Release.rls\obj\Catalogs\ScrTest.hlp 
;    -e NameDB -l -o 
;    D:\TMP\ScrTest.rel\Release.rls\out\Names.dat\EX\ScrTest\ScrTest.ndb 
;    -e CPublicHead -v -s -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\Include\ScrTest\ScrTest.h -e 
;    CPrivateHead -v -s -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\Include\ScrTest\Internal\ScrTest.ph 
;    -e AsmMSDOS -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\src\EX\ScrTest\_dos.asm -e 
;    AsmWin32 -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\src\EX\ScrTest\_win32.asm -e 
;    CModuleCode -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\src\EX\ScrTest\book.c -e 
;    CModuleHead -o 
;    D:\TMP\ScrTest.rel\Release.rls\obj\Include\ScrTest\book.h 
; 
; THIS FILE IS COMPUTER GENERATED, NO HUMAN GENERATED CHANGES ARE PERMITTED
; 
VERSION 2
REVISION 20
LANGUAGE "English"
NATURALNAME "Screen Test"
