Quake Command Line

Please specify a command string that will launch quake.  The ^ symbol will be replaced with the currently selected server name.

Caveat: You must run qlaunch indirectly via a batch file such as q95.bat or quake will not be able to locate the quake server.  This appears to be a limitation of the mpath IP tunneling technology.

For example here is the command line string that I use:

q95.bat -nojoy -noipx -winmem 8 +connect ^

(You mileage may vary…)

The +connect option does all the work.  The ^ symbol after this option is merely replaced with the currently selected quake server.

Quake Working Directory

Please specify a working directory for the above command line string.  This should be the same directory as the q95.bat file.