FlowCharter 7

Congratulations and thank you for buying FlowCharter 7 from Micrografx. This package offers superior diagramming and flowcharting tools for Windows 95.

FlowCharter 7 allows all business people to create a broad array of diagrams with easy and powerful ready-to-use tools. FlowCharter provides Office users with a drag-and-drop environment which facilitates the creation of popular structured business graphics from simple organizational charts to large, wall-sized process maps.

FlowCharter 7 is a full 32-bit program, ensuring you benefit from all Windows 95 32-bit operating system attributes including long file names, multitasking, OLE 2.0, flat memory address support, and desktop shortcuts.


Micrografx Software Licence Agreement (with Network Provisions)
Micrografx End-User License Agreement

This is a legal agreement between you (an individual or an entity), the end user, and Micrografx, Inc. If you do not agree to the terms of this Agreement, promptly return this product and accompanying items (including written materials and binders or other containers) to the place you obtained them for a full refund. By installing, copying, downloading, or otherwise using the software product, you agree to be bound by the terms of this license.

1. Grant of License.

This Micrografx End-User License Agreement ("this License") permits you to use one copy of the Micrografx software product ("the Software") on any single computer, provided the Software is in use on only one computer at any time. If the Software is permanently installed on the hard disk or other storage device of a computer (other than a network server), then the person authorized to use such computer also may use the Software on a portable computer, laptop and home computer so long as the Software is not used on both computers at the same time. If such person's authorization to use such computer ceases for any reason (e.g. termination of employment), then such person's authority to use the software on a portable computer, laptop and home computer will cease. The Software is licensed as a single unit, and its component programs may not be separated for use on different computers.

2. Ownership.

Title, ownership rights, and intellectual property rights in and to the Software will remain in Micrografx and is protected by United States copyright laws and international treaty provisions. There is no transfer to you of any title to or ownership of the Software and this License should not be construed as a sale of any right in the Software. You must treat the Software like any other copyrighted materials, except that you may either (a) make one copy of the Software solely for backup or archival purposes, or (b) transfer the Software to a single hard disk provided that you keep the original solely for backup or archival purposes. You may not copy written materials accompanying the Software. You may use the Software in you own personal and business documents as long as you are not selling the output generated by the Software or any related services. You may modify the Software and/or merge it into another computer program to the extent necessary for your own use on the network or computer, but any portion of the Software merged into another computer program will continue to be subject to this License.

3. Upgrades.

If the Software is labeled as an upgrade, you must be properly licensed to use a product identified by Micrografx as being eligible for the upgrade in order to use the Software. The Software labeled an "upgrade" replaces and/or supplements the product that formed the basis for your eligibility for the upgrade. The upgrade may not be separated for use from the product, or transferred separately or used on more than one computer except as set forth above.

4. Other Restrictions.

This License is your proof of license to exercise the rights granted herein and must be retained by you. You may not rent or lease the Software, but you may transfer your rights under this License on a permanent basis provided that you transfer this License, the Software and all accompanying written materials, you retain no copies, and the recipient agrees to the terms of this License. You may not translate, decompile, or disassemble the Software or make any attempt to discover the source code to the Software. If the Software is an update, any transfer must include the update and all prior versions. Further, you may not place the Software onto a server so that it is accessible via a public network such as the Internet.

5. Multiple Media.

You may receive the Software in more than one medium. Regardless of the type or size of the medium you receive, you may use only the media appropriate for your single designated computer or network server. You may not use any other media on another computer or computer network, or loan, rent, lease, or transfer them to another user except as part of a transfer or other use expressly permitted by this License.

6. Limited Warranty.

MICROGRAFX WARRANTS THAT THE SOFTWARE WILL PERFORM SUBSTANTIALLY ACCORDING TO THE ACCOMPANYING WRITTEN MATERIALS FOR NINETY (90) DAYS FROM THE DATE OF ORIGINAL PURCHASE. MICROGRAFX DISCLAIMS ALL OTHER WARRANTIES., EITHER EXPRESS OR IMPLIED (INCLUDING WITHOUT LIMITATION, IMPLIED WARRANTIES OR MERCHANTABILITY AND FITNESS FOR A PARTICULAR PURPOSE) CONCERNING THIS SOFTWARE AND ITS ACCOMPANYING WRITTEN MATERIALS. Some jurisdictions do not allow limitations on duration of an implied warranty, so the above limitation may not apply to you. This limited warranty gives you specific legal rights. You may have others which vary by jurisdiction.

7. Customer Remedies.

Micrografx's entire liability and your exclusive remedy will be replacement of the Software by Micrografx that does not meet Micrografx's Limited Warranty and that is returned to Micrografx with a copy of your receipt. This Limited Warranty is void if failure of the Software has resulted from accident, abuse, or misapplication. Any replacement Software will be warranted for the remainder of the original warranty period or thirty (30) days, whichever is longer.

8. Limitation of Liability.

In no event will Micrografx or its suppliers be liable for any damages whatsoever (including, without limitation, damages for loss of business profits, business interruption, loss of business information, or other precuniary loss) arising out of the use or inability to use the Software, even if Micrografx has been advised of the possibility of such damages. Because some states do not allow the exclusion or limitations of consequential or incidental damages, the above limitations may not apply to you.

9. Export Restrictions.

You may not export or reexport the Software or any underlying information of technology except in full compliance with all United States and other applicable laws and regulations.

10. U.S. Government Restricted Rights.

The Software and documentation are provided with Restricted Rights. Use, duplication, or disclosure by the government is subject to restrictions as set forth in subparagraph (c) (1) (ii) of the Rights in Technical Data and Computer Software clause as DFARS 252.227-7013 or subparagraphs (c) (1), and (2) of the Commercial Computer Software-- Restricted Rights at 48 CFR 52.227-19, as applicable, and any amendments thereto. Contractor/manufacturer is Micrografx, Inc., 1303 Arapaho Rd., Richardson, TX 75081.

11. Miscellaneous Provisions.

This Agreement is governed by the laws of the State of Texas, USA (and not by the 1980 United Nations Convention on Contacts for the International Sale of Goods, as amended). This is the entire agreement between us relating to the Software and supersedes any purchase order, communication, advertising, or representation concerning the Software. No change or modification of this License will be valid unless it is in writing and is signed by Micrografx. If this Software was acquired outside the United States, then local law may apply. If you acquired this Software in Canada, you agree to the following:

The parties to this License have expressly required that the License be drawn up in the English language.

Les parties aux presentes ont expressement exige que las presente convention soient redigees en langue anglaise.

For more information about Micrografx's licensing policies, please call Micrografx Customer Service at 1-972-234-1769 or write: Micrografx Customer Sales and Service, 1303 Arapaho Rd., Richardson, TX 75081, USA.

Revised 6/97


License Agreement: Frequently asked questions

•	What is the significance of the Micrografx software license agreement? The license agreement is the document under which Micrografx grants you, the end user, the right to use the software product. In addition to the end user license agreement, your use is governed by the U.S. Copyright Act.

•	How has Micrografx changed its end user licensing policy? Micrografx has changed its end user license agreement to simplify how its products are licensed for home, portables, and laptop use. Micrografx has always provided concurrent usage to its customers and continues that in this agreement.

•	What does the license say? The underlying principle of Micrografx's licensing policy has been and continues to be that each use of a Micrografx product requires a license. Each license grants you the right to use one copy of the software product on your computer. In addition, the license sets out the rules by which you may "concurrently" use the product on a computer network, and grants you the right to make and use a second copy of the product on a home and laptop computer in certain circumstances (described in more detail below).

•	How do I determine how many licenses I need for my company to comply with the Micrografx license agreement? Starting with the principle that you need one license for each use of the product, there are two basic rules that you need to follow in counting the number of "uses" of the product in your company. First, each copy of the product that is installed on a hard disk or other storage device of a computer is a "use" that requires one license. Second, if you plan to use the product on a computer network, and you have fewer licenses than the total number of workstations, then you need to determine the maximum number of users of the product you will have at any one time. The total number of "uses," arrived at by adding the number of copies that you will have installed on hard disk plus the maximum number of users on a network, determines the number of licenses you need.

•	How do I determine the "maximum number of users" in my company's computer network?  To comply with the Micrografx license agreement, you must have adequate controls and mechanisms in place to ensure that you have at least as many licenses as you have uses of the product at any one time. While there is no single method that Micrografx requires or prescribes, you must have electronic or manual controls or procedures to justify your calculation of the number of licenses. For example, there are electronic devices and software programs that limit access to particular products running off a network server that would comply with this requirement (see the next question about "electronic token" technologies). As an example of a manual method of making this calculation, some companies periodically poll their users to determine how many employees never use the product, and then simply purchase licenses for the remaining number of users.

•	If I load the product on the hard disk of every workstation on the network, can I still count the number of users so I don't have to purchase a license for every workstation? Is the answer different if I use the so-called "electronic token" technology to limit the actual number of users?  No. And no. Loading the product onto the hard disk or other storage device of a network workstation is a "use" that requires a license. It makes no difference if you have an "electronic token" system to regulate use. The only way you may have fewer licenses than workstations on a network is when some of the workstations access the product off the network server itself (i.e., the product is not stored on the workstation's hard disk) and you have determined that less than all of the workstations use the product at any one time. Of course, if you transfer or "download" the product from the server to a workstation's hard disk, which requires one license, you may later completely delete the product off that hard disk to free up that one license for use elsewhere.

•	Do I need a separate license for the copy of the product on the server? No. You need not count the server as one "use," provided that the server copy is merely accessed by the workstations connected to it and not used separately.

•	If I have a Micrografx program loaded into the temporary memory (RAM) of my network, but it is iconized and not actively in use, is a license required? Yes. We consider that you are "using" one of our products whenever it is loaded on your hard disk or in RAM. Thus, a program that is iconized requires a license because it was first loaded into memory, or RAM. Remember, however, that unlike a product stored on a workstation's hard disk (requiring one license), a product run off the server may be terminated or closed quickly, freeing up that product license for use by another workstation on the network.

•	Does Micrografx continue to allow end users to make a second copy of its program for home and laptop use? Yes. If you have a Micrografx product loaded on the hard disk or other storage device of your computer, then you may make a second copy for home and laptop use. The principle here is to allow you to use the Micrografx product even when you are away from work, either at home or while traveling. However, this does not apply to products that are loaded on the network server. (Some companies have their own restrictions on home software use, so you may need to check with your systems administrator on this topic.)

•	Is this Micrografx license a site license? If not, how does it differ? This Micrografx end user license is not a site license because each use requires a separate license. In a "site license," a company is given unlimited rights to internal use of a software product for a flat fee.

For additional copies of this Micrografx Software License Agreement, contact: Micrografx, Inc.,
Attn: Legal Department, 1303 Arapaho Rd., Richardson, Texas 75081.

Information in this document is subject to change without notice and does not represent a commitment on the part of Micrografx, Inc. The software described in this document is furnished under a license agreement. The software may be used or copied only in accordance with the terms of the agreement.


Copyright and Trademark Statements

Copyright

Copyright © 1997 by Micrografx, Inc. All Rights Reserved. No part of this publication may be reproduced, transmitted, stored in a retrieval system, or translated into any language in any form by any means without the permission of Micrografx.

Micrografx, Inc.

1303 Arapaho

Richardson, TX 75081

Sales and Marketing: 972-234-1769

Trademark acknowledgments

Micrografx, the Micrografx logo,and FlowCharter are registered trademarks and ABC Graphics Suite, ABC Media Manager, Micrografx Designer, Designer for OS/2, Draw for OS/2, Charisma, Graphics Works, PhotoMagic, and Micrografx ClipArt are trademarks of Micrografx, Inc.

Adobe, Adobe Type Manager, ATM, PostScript, and Adobe Illustrator are registered trademarks of Adobe Systems, Inc.

Ares Software Corporation is the copyright owner of portions of this software. © Ares Software Corporation. All Rights Reserved.

AutoCAD is a registered trademark of Autodesk, Inc.

Classic PIO Partners and Classic Photographic Image Objects are trademarks of Classic PIO. Copyright © Classic PIO Partners. All Rights Reserved. Images made in the USA.

CompuServe is a registered trademark of CompuServe, Inc.

First Impressions® is a registered trademark and Formula OneTM and Visual Components TM are trademarks of Visual Components, Inc. Copyright © 1994-95 Visual Components, Inc. All Rights Reserved.

GEM and Artline are registered trademarks of Digital Research, Inc.

Hewlett-Packard is a registered trademark of Hewlett-Packard Company.

IBM is a registered trademark of International Business Machines Corporation.

IMSI CAD Symbols® copyright © 1995 IMSI, Inc. All Rights Reserved.

ImageStream TM Graphics and Presentation Filters copyright © 1991-1995 ImageMark Software Labs, Inc. All Rights Reserved.

International CorrectSpell TM English spelling correction system © 1994 by INSO Corporation. All rights reserved. Reproduction or disassembly of embodied algorithms or database prohibited.

Macintosh is a registered trademark and TrueType is a trademark of Apple Computer, Inc.

Microsoft and MS-DOS are registered trademarks and Windows is a trademark of Microsoft Corporation.

Paintbrush is a trademark of ZSoft Corporation.

Pictures NOW! TM is a trademark of Wood River Gallery. Copyright © 1994 Wood River Gallery. All Rights Reserved.

Portions licensed under U.S. Patent No. 4,558,302 and foreign counterparts.

Windows Draw® and Windows OrgChart are trademarks of their respective owners.

WordPerfect and DrawPerfect are registered trademarks of WordPerfect Corporation.

Other products mentioned are trademarks or registered trademarks of their respective companies.

This commercial computer software and documentation are being provided to the government with RESTRICTED RIGHTS. Use, duplication, or disclosure by the Government is subject to restrictions as set forth in subparagraph (C)(2) of FAR 52.277-19 or subdivision (c)(I)(ii) of DFAR 52.227-7013.

 Dutch and Swiss are trademarks of Bitstream Inc.  Balloon, Brush Script, Century Schoolbook, Dom Casual, Franklin Gothic, and Goudy Old Style are trademarks of Kingsley-ATF Type Corporation. Playbill is a registered trademark and Windsor is a trademark of Stephenson Blake & Company Ltd.

IEC- and ISO-standard symbols included on the CD-ROM are copyrighted by the International Electrotechnical Commission (IEC) and the International Organization for Standardization (ISO), respectively.  Neither IEC nor ISO accept responsibility for the accuracy of their respective symbols reproduced by Micrografx.

The IEC- and ISO-standard symbols included on the CD-ROM have symbol names according the numbers used for the individual symbols in the published IEC or ISO standards. As the symbol names do not include the actual description of the symbols, it would be handy to have the printed standards to work with.

To order the printed standards for the IEC- and ISO-standard symbols included on the CD-ROM, please contact one of the following organizations.

International Electrotechnical Commission (IEC)	International organization for Standardization (IS))
3, rue de Varembé	1, rue de Varembé
P.O. Box 131	P.O. Box 56
CH-1211 Geneva 20	CH-1211 Geneva 20
Switzerland	Switzerland
Tel. (+41) (0) 22 734 0150	Tel. (+41) (0) 22 749 0111
Fax (+41) (0) 22 733 3843	Fax (+41) (0) 22 733 3430
For both IEC and ISO symbols in the United States, contact:	For both IEC and ISO symbols in the United Kingdom, contact:
American National Standards Institute (ANSI)	BSI Standards
11 West 42nd Street	Linford Wood
New York, NY 10036	Milton Keynes MK14 6LE
Attn: Customer Services	United Kingdom
Tel. (212) 642-4900	Tel. 0908 221166
Fax (212) 302-1286	Fax 0908 322484
Please note that IEC 617 is similar to IEEE 315, 315A, 91, and 91A.

Please note that IEC 617 corresponds to BS 3939, ISO 3511 corresponds to BS 1646, ISO 4066 corresponds to BS 4466, ISO 4067 (parts 1, 2, and 6) corresponds to BS 1192 (part 3), and ISO 6284 corresponds to BS 1192 (part1).


Network Installation of FlowCharter 7

For information on installing FlowCharter 7 on a network, double-click the Netread.hlp icon on the root of the application CD-ROM from Windows Explorer. This help file gives detailed installation instructions for use by network administrators.


Uninstalling FlowCharter 7

You can uninstall the FlowCharter 7 package from your hard drive.

1.	Click the Start button, and point to Settings.

2.	Click Control Panel, and double-click the Add/Remove Programs icon.

3.	Highlight Micrografx FlowCharter 7 if you want to delete it.

4.	Click Add/Remove and follow the instructions on your screen.


Contacting Technical Support

Micrografx offers a number of technical support services for FlowCharter 7. Please call (972) 234-2694 for further information regarding free and fee-based support options, fax support and on-line services.


Contacting Micrografx through Online Services

Micrografx maintains forums on America Online, CompuServe and the Microsoft Network for Technical Support inquiries, requests, and new product information and updates. Locate keyword MGX on America Online, type GO MICROGRAFX on CompuServe or type GO MGX on the Microsoft Network to access the most helpful Technical Support in the industry. (Not available for the 30-day trial version.)

In addition, you can contact Micrografx through our Web site on the Internet. Our Web address is http://www.micrografx.com.


Resolving Problems with Specific Printers

•	Objects do not crop, TrueType fonts print with a square opaque white background, or lines show through text when printing to an HP PaintJet printer. Update to the latest version of the HP PaintJet driver.

•	Bitmaps printed to the HP DeskJet printer repeat the image or are rotated incorrectly. Update to the latest version of the HP DeskJet driver.

•	Bitmaps printed to the HP 550C printer are extremely dark and oversaturated, or do not print correctly. Update to the latest version of the HP 550C driver.

•	OLE objects from earlier versions of Micrografx products (Designer 3.1 and earlier, Charisma 2.1 and earlier, Draw 3.0 and earlier) do not print to a PostScript printer. Export the object from the earlier version of the Micrografx product, then import it into Designer 6.0.

•	Printing a Designer drawing to a Level 1 PostScript printer, a piece of one corner of a rectangle is missing. This happens when you create an EPS file in Designer and put the EPS image into certain programs. To fix it, on the Registry tab of the Options dialog box, add the Value Name EnablePSAdapt to the Mgxgre key, and give it a numeric value of 0. Then set the options of the printer driver to EPS. Print. Print to EPS and use the new file.

•	Printing to an AutoGrafix device, there is a white line at the top of the 35 mm slide. When printing to 35 mm slides, choose a page size of Use Printable rather than 35mm in the Page Setup dialog box. Also, choose Center on Page in the Print Document dialog box.


Troubleshooting

What is the problem?

 I can't find the icon. How can I run the program?

 Why don't I have all the fonts?

 How much disk space is required to install FlowCharter 7?

 How do I permanently remove the FlowCharter 7 toolbar button from Word and Excel?

 Why is the FlowCharter 7 toolbar button on Excel's toolbar after I uninstalled?

 Why isn't the Send option working in my program?


I can't find the icon. How can I run the program?

You can run FlowCharter 7 by clicking the Start button on the Windows 95 Taskbar. On the Start menu, point to Programs and then click Micrografx FlowCharter.

You also can create a shortcut to the program. To learn how, click the Start button on the Windows 95 Taskbar. On the Start menu, click Help. In the Help Topics dialog box, click the Index tab and type the word "icon." In the second list, double-click "creating icons for your programs."


Why don't I have all the fonts?

To install individual features, choose the Custom Installation option. This option lists each feature such as filters, fonts, and clip art, which allows you to customize your software or to add features not previously installed.

You can install additional fonts, also, through Control Panel.

1.	Insert the application CD-ROM in the drive.

2.	Click Start, point to Settings and click Control Panel.

3.	Double-click the Fonts icon.

4.	On the File menu, click Install New Font.

5.	Select your CD-ROM drive in the Drives drop-down list.

6.	Double-click the Fonts folder in the Folders drop-down list.

7.	Highlight the fonts you want to install or click Select All to choose all the fonts.

8.	Click Ok.


How much disk space is required to install the entire program?
How much disk space is required to install FlowCharter 7?

During installation, each option you select should display the amount of disk space required to completely install your selection. If the amount of disk space shown is not enough to install your selection, clear off more disk space or change to a location on your hard drive where more disk space is available.


How do I permanently remove FlowCharter 7, Picture Publisher, and Designer toolbar buttons from Word and Excel?
How do I permanently remove the FlowCharter 7 and Media Manager toolbar buttons from Word and Excel?

1.	Remove the buttons from the Office programs through the Customize routine.

2.	Delete the following installed executable files which install the buttons and process the pressing of the buttons:

Word (c:\msoffice\winword\startup if you installed to the default directory):

dsword.wll (Designer button)

emword.wll (ABC Media Manager button)

floword.wll (FlowCharter button)

ppword.wll (Picture Publisher button)

Excel (c:\msoffice\excel\startup if you installed to the default directory):

dsword.xla (Designer button)

emword.xla (ABC Media Manager button)

flowword.xla (FlowCharter button)

ppworld.xla (Picture Publisher button)

and, delete the following files installed in the Excel main directory

(c:\msoffice\excel if you installed to the default directory)

dsword.wll (Designer button)

emword.wll (ABC Media Manager button)

floword.wll (FlowCharter button)

ppword.wll (Picture Publisher button)


Why are my FlowCharter 7 toolbar buttons still on the Excel toolbar after I uninstalled it?
Why are my FlowCharter 7 toolbar buttons still on the Excel toolbar after I uninstalled FlowCharter 7?

There is a known problem with Microsoft Excel 7.0 where toolbar buttons that are deleted programatically (like FlowCharter 7's uninstaller) don't stay deleted. If you see FlowCharter 7 buttons on the toolbar after having unistalled, perform the following steps:

1.	Run Microsoft Excel.

2.	Place the cursor on the Excel toolbar and click the right mouse button.

3.	Select the Customize menu item. The Customize dialog box displays.

4.	Position the cursor over the button you want to delete on the toolbar.

5.	Click the left mouse button and drag the button off the toolbar, releasing the left mouse button when the button outline is off the toolbar.

6.	Repeat steps 4 and 5 for every button you want to delete.


Why isn't the Send option working in my program?

If you've installed MSMail 3.0 mail client software on your system after uninstalling Microsoft Exchange, you can't use the Send option in FlowCharter 7. You should use Microsoft Exchange as the mail client software on your Windows 95 system rather than MSMail 3.0.


Updated import and export filters

	Source	Ext
	Adobe Illustrator AI	.ai
	Adobe Photoshop	.psd
	AutoCAD Drawing	.dwg
	AutoCAD DXF	.dxf
	CompuServe Bitmap	.gif
	CompuServe Portable Network Graphics	.png
	Computer Graphics Metafile	.cgm
	Corel Clip Art Format	.cmx
	CorelDRAW! 3.0, 4.0, 5.0	.cdr
	Digital Research GEM	.gem
	Encapsulated PostScript/AI EPS	.eps
	HP Graphics Language	.hgl
	HP Graphics Language	.plt
	IGES Drawing	.igs
	JPEG File Interchange	.jpg
	Kodak Photo CD	.pcd
	Macintosh PICT	.pct
	Micrografx Drawing	.drw
	Micrografx Picture Publisher 4.0	.pp4
	Micrografx Picture Publisher 5.0	.pp5
	Micrografx Picture Publisher	.ppf
	PC Paint	.pcx
	PostScript	.prn
	PostScript	.ps
	Scitex CT	.sct
	Sun Raster	.ras
	Tagged Image File Format	.tiff
	Targa Bitmap	.tga
	Windows Bitmap	.bmp
	Windows DIB	.dib
	Windows Enhanced Metafile	.emf
	Windows Metafile	.wmf
	WordPerfect Graphics 1.0, 2.0	.wpg
Note

This is the entire list of all supported filters. If you don't see the filter you want in FlowCharter 7, choose the Custom installation option from the installer and select the desired filter(s).


FlowCharter 7 Read Me
Read This First

GENERAL

•	Fully qualified filenames over 128 characters may not be detectable or accessible. This includes many file types including program components, data files, clip art, palettes, etc. If this occurs, make sure the filename (including the path) is less than 128 characters.

•	FlowCharter 7 doesn't support CMYK JPEG images. Although most CMYK JPEG images will produce a "not supported" message, some images will cause the program to stop responding.

•	You can add TrueType fonts directly from the CD-ROM. Open the Windows Control Panel and choose Fonts. On the File menu, click Install New Font. Select the CD-ROM drive letter and the Fonts folder on the CD as the path to locate fonts. In the list box, choose the fonts to add to your system and click OK.

•	FlowCharter 7 supports double-byte character sets. This means that if you run FlowCharter 7 on the Chinese or Korean versions of Windows 95, you can use native, non-English character sets.

FLOWCHARTER

To access OLE Automation help using Excel

1.	Run Excel.

2.	On the Insert menu, click the Macro command.

3.	Choose Module.

4.	On the Tools menu, click the References command.

5.	Click Browse. Search for the flow70.tlb file where FlowCharter 7 is installed and select it. (For example, "C:\Program Files\Micrografx\FlowCharter\Flow70.tlb")

6.	Click Micrografx FlowCharter OLE Automation 7.0 so an X appears in the box in front of it.

7.	Click OK to close the dialog box.

8.	On the View menu, click the Object Browser command.

9.	Click the down arrow to the right of the Libraries/Workbooks box.

10.	Click FlowLib to select it.

11.	Click the object you want information about in the Objects/Modules box.

12.	Click the button with a question mark in it, if you wish. OLE Automation help appears showing the topic about that object.

or

13.	Click the method or property you want information about in the Methods/Properties box.

Tip

•	If the button with a question mark in it is gray, then the help file is not installed. You must install the help file using the Installation program.