[Entry]
Entry_Name=Direct Connection - London Videotron

[User]
Name=
Password=
Display_Password=no

[Phone]
Dial_As_Is=no
Phone_Number=2652211
Area_Code=0181
Country_Code=44
Country_ID=44

[Device]
Type=modem

[Server]
Type=PPP
SW_Compress=no
PW_Encrypt=no
Network_Logon=no
Negotiate_TCP/IP=yes

[TCP/IP]
Specify_IP_Address=no
Specify_Server_Address=Yes
DNS_Address=194.112.32.1
DNS_Alt_Address=194.112.32.10
IP_Header_Compress=yes
Gateway_On_Remote=yes

[Internet_Mail]
EMail_Name=
EMail_Address=
POP_Server=popmail.dircon.co.uk
POP_Logon_Name=
POP_Logon_Password=
SMTP_Server=mailhost.dircon.co.uk
Domain=dircon.co.uk
Install_Mail=1
Use_MS_Exchange=No

[Internet_News]
NNTP_Server=news.dircon.co.uk
Logon_Required=0
Install_News=1

[Proxy]
Proxy_Enable=1
HTTP_Proxy_Server=http://www-cache.dircon.co.uk:8080
Gopher_Proxy_Server=http://www-cache.dircon.co.uk:8080
Use_Same_Proxy=0
Proxy_Override=<local>;dircon.net;dircon.co.uk
FTP_Proxy_Server=:80
Secure_Proxy_Server=:80
Socks_Proxy_Server=

[Provider_Info]
Voice_Number=0181 297 8833

[Branding]
Window_Title=Direct Connection Internet Explorer
CompanyName=Direct Connection
Custom_Key=A150756705

[CustomSignup]
1=CANCEL.INS
NumFiles=7
3=DCCOL.GIF
4=INSTAL.INS
5=LONDVT.INS
6=NATIONAL.INS
7=SIGNUP.HTM
8=SIGNUP.ISP

[Custom]
Run=IEMail.reg