[Branding]
Type=1
Serverless=1

[Entry]
Cancel=yes
Entry_Name=TiscaliNet

[User]
Name=abort
Password=abort

[Phone]
Dial_As_Is=no
Phone_Number=678201
Area_Code=070
Country_Code=39
Country_ID=39

[Device]
Type=modem

[Server]
Type=PPP
SW_Compress=yes
PW_Encrypt=no
Negotiate_TCP/IP=yes

[TCP/IP]
Specify_Server_Address=Yes
IP_Header_Compress=yes
Gateway_On_Remote=yes
DNS_Address=195.130.224.18
DNS_Alt_Address=195.130.225.129
