<AlacartE (TM) ver 4.00 - Setup Help - Nov 1993>
<(C)Copyright ProSofT AlacartE - South Africa>
<htext   >
 Define the title of this horizontal menu option.
<hkeys   >
 Define a hot key  for this  horizontal menu
 option.  A hot key is ANY alphanumeric that
 appears in the respective menu option title.
 Hot  keys  definition  provides  additional
 operating  convenience,   while  using  the
 keyboard,  it is however  NOT  compulsory !
<vopt    >
 Define the title of this vertical menu option.
<vkey    >
 Define a hot key for this vertical menu option.
 The hot key is  ANY  alphanumeric that appears
 in the respective title.
<path    >
 Define the path (drive and directory) from
 where the  program/utility  will be run at
 the selection of this menu option.
 Example: if typed  C:\UTILS the command is
 run at DOS prompt 'C:\UTILS>'.
<cmnd    >
 Define the DOS command that will start the
 desired program/utility  at  the selection
 of this vertical option.

 Advanced users:  use "->" to prompt for
 command or "<command>->"  to prompt for
 command tail prior to execution.
<hhelp   >
 Define the vertical menu for
 this horizontal menu option.
 To terminate  vertical menus
 setup, select option <Quit>,
 or press <Esc>, or click the
 right-hand mouse button.
<mtitleo >
 Personalize this menu by selecting 
 your own title. This title appears 
 centred  on the top of the screen.
<mtitle  >
 Enter the Menu title.
<hmoptso >
 Define the horizontal menu options
 and the hot keys for operation.

 NOTE : "Quit" is a standard option.
 ===================================
<voptso  >
 Define vertical menus titles, their
 hot keys, programs and paths.
<colors  >
 Change background and foreground colors
 of screen, menus options, hot keys  and
 selection highlight.
<qconfigo>
 Terminate the Setup utility and
 return  to  the  AlacartE Menu.
<vquit   >
 Terminate the Vertical Menus setup
 and return to the Main menu of the
 Setup utility.
<dcolors >
 Reset to default colors.
<backgrnd>
 Select screen background color.
<hcolors >
 Select colors for the horizontal
 menu options and their hot keys.
<vcolors >
 Select colors for  the  vertical
 menu options and their hot keys.
<selectv >
 Select colors for the vertical menu
 selection highlight.
<selecth >
 Select colors for horizontal menu
 selection highlight.
<kbtimout>
 Select the Keyboard timeout,
 for screen blanking purpose.
<setkbtmo>
 Keyboard Timeout is the period (seconds)
 from the last key stroke, or mouse click 
 to the screen blanking.   Valid keyboard
 timeout ranges from  10 to 32000 seconds 
 (ie. 10 sec. to approx. 8 hours 45 min.)
<scrncmnd>
 The utility to be run as the 'screen saver'.
 This should be interruptible  by  the strike
 of any key, or the click of any of the mouse
 buttons.    This utility must also blank the
 screen before terminating.    The default is
 ALASCRSV (supplied with AlacartE).
<scrnpath>
 The path of the 'screen saver' utility.  The
 default is set to the  AlacartE installation
 drive and directory.
<keyerror>
 It is advisable but NOT strictly necessary,
 to define appropriate hot-keys.    If these  
 are not properly defined, selections can be
 made using the mouse or the arrow keys.
<invsound>
 Turn sound ON/OFF for invalid key-strokes.
 This sound must be turned OFF if TSRs that
 are activated by  "hot keys" are installed
 prior to AlacartE being invoked.
<nocnffil>
 The configuration file was NOT found !
 You may now define a new configuration
 by pressing <F2> and using the Set-up.
 If  you have lost  your configuration,
 please request technical advise.
<conftitl>
 If confirmed,  the menu title will be saved.
 To leave the previous title unchanged, press
 <F2> now.   This returns to the menu without
 saving the currently defined title.
<confkbto>
 If confirmed,  the keyboard timeout and the 'screen
 saving'  command and path will be saved.   To leave
 the previous keyboard timeout  and  'screen saving'
 setup unchanged, press <F2>.    This terminates the
 Setup utility and returns to the menu without save.
<confvert>
 If confirmed, the vertical menu will be saved.
 To leave the previous vertical menu unchanged,
 ie.  discard all latest changes,   press <F2>.
 This returns to the menu without save.
<confhorz>
 If confirmed, the horizontal menu will be saved.
 To leave the previous horizontal menu unchanged,
 ie.  discard all latest changes,  press <F2>.
 This returns to the menu without save.
<confsund>
 If confirmed, the sound set-up will  be saved.
 To leave the previous  sound setup  unchanged,
 press <F2>.   This returns to the menu without
 save.
<userintr>
 Select Character User Interface
 or Graphic User Interface, only
 available with EGA, VGA upwards.
<delhbusy>
 The deleted horizontal menu option(s) contain
 vertical menu definitions.  The vertical menu
 definitions must be cleared first. Select the
 'Vertical menu options',  then the horizontal
 option to delete, press <F4> to clear all the
 vertical  definitions,  then  <F10>  to save.
<delhmenu>
 Multiple horizontal menu options deletion is
 accepted ONLY if selected options are in one
 group.   Otherwise horizontal menu option(s)
 may be deleted ONE AT A TIME.
<select16>
 Some 'badly written' TSR programs address the
 graphics display and return without restoring
 the previous setup.  In these cases undesired
 colors blinking is experienced upon return to
 the AlacartE menu. Selecting eight (8) colors
 only mode provides a quick and easy fix.
<end>
