Copyright: Copyright (c) 1995 by Micrografx, Inc.
Citation: Copyright (c) 1995 by Micrografx, Inc.


Generalidades de la instalación en red

Si posee la licencia para instalar Micrografx FlowCharter 7 en más de un ordenador cliente, existen dos formas de instalar FlowCharter 7 en la organización. Puede distribuir el CD-ROM de FlowCharter 7 a cada uno de los usuarios finales, o puede instalar FlowCharter 7 en la red e instalarlo en cada usuario final a partir de aquí. La información de este archivo explica la segunda opción.

Notas

Los archivos de muestra que necesitan los usuarios cuando utilizan los cursos de aprendizaje se localizan en el CD-ROM, en un directorio denominado TUTORIAL. Copie estos archivos en la red, notifique a los usuarios donde se encuentran y permita que los usuarios lo copien en sus unidades locales.

Cuando se lleva a cabo la desinstalación de un cliente, las fuentes TrueType permanecen en la lista de fuentes de la memoria de Windows. Para actualizar la lista de fuentes de la memoria, reinicie Windows.


Instalación de FlowCharter 7 en la red

Soporte de nombres de archivo largos en Novell 3.11


Instalación de FlowCharter 7 en la red

La instalación de FlowCharter 7 en la red se hace en dos pasos:

1	El administrador crea el punto de instalación administrativa ejecutando el programa de instalación y creando el grupo de carpetas que contendrán el software de FlowCharter 7 y a partir del cual se realizarán las instalaciones en los clientes.

2	Los usuarios instalan FlowCharter 7 ejecutando el programa de instalación desde el punto de instalación administrativa.

Notas

En cada uno de estos pasos se utiliza el mismo Setup.exe, aunque con dos archivos de comandos diferentes. Para evitar confusión, nos referiremos a  estos dos archivos de comandos según se indica a continuación:

Instalación administrativa--Para crear el punto de instalación administrativa, se ejecuta Setup.exe desde del medio físico.

Instalación del cliente--Para realizar la instalación del cliente, el usuario ejecuta Setup.exe desde el punto de instalación administrativa.

Los archivos de muestra que necesitan los usuarios para utilizar los cursos de aprendizaje se localizan en el CD-ROM en un directorio denominado TUTORIAL. Copie estos archivos en la red, notifique a los usuarios donde se encuentran y permita que los usuarios lo copien en sus unidades locales.


Creación del punto de instalación administrativa


Para instalar FlowCharter 7 en el punto de instalación administrativa

Para instalar FlowCharter 7 en el ordenador cliente


Creación del punto de instalación administrativa

Es necesario ejecutar la instalación administrativa en Windows 95, en Windows NT 3.51 (o posterior) o en Windows NT Advanced Server 3.51 (o posterior).

El punto de instalación administrativa debe tener como mínimo 90 MB de espacio de disco, y el administrador permiso para leer, escribir, eliminar y crear en esta localización. Los usuarios necesitan tener acceso a lectura.

Para utilizar el modo administrativo de la configuración, es necesario instalar todos los archivos de FlowCharter 7 CD en el punto de instalación administrativa. Consiste en una carpeta primaria que crea la rutina de la configuración.

Nota

Antes de ejecutar la instalación administrativa de FlowCharter 7, asegúrese de que:

Las carpetas de destino están vacías. Si existe una versión anterior de FlowCharter 7, borre todas.

Las carpetas se encuentran bloqueadas para el acceso del usuario de la red durante la instalación administrativa.

El software de detección de virus está inactivo.


Para instalar FlowCharter 7 en el punto de instalación administrativa


Para instalar FlowCharter en el punto de instalación administrativa

1	Ejecute el archivo Setup.exe del CD. Debe ejecutar Setup.exe desde una estación de trabajo que tenga acceso a escritura al servidor, no directamente en el mismo servidor.

2	Siga las instrucciones de la pantalla. Cuando se le pida el nombre de usuario, introduzca el nombre de usuario "Network" (sin comillas) para comenzar la instalación de un punto administrativo. El programa de instalación copia todos los archivos del CD al punto de instalación administrativo.

3	Una vez completada la instalación, comparta la carpeta (\MGXSUITE) en la red.

Notas

El nombre de organización que introduzca será el que se utilice para todas las instalaciones de cliente de FlowCharter 7 desde esta localización de red.

Cuando se le pregunte por el servidor y vía de acceso de la carpeta de programas compartidos, introduzca el nombre en la misma forma en que lo especificarán los usuarios cuando instalen FlowCharter 7.

Los archivos de muestra que necesitan los usuarios cuando utilizan los cursos de aprendizaje se localizan en el CD-ROM, en un directorio denominado TUTORIAL. Copie estos archivos en la red, notifique a los usuarios donde se encuentran y permita que los usuarios los copien a sus unidades locales.


Para instalar FlowCharter en el ordenador del cliente


Para instalar FlowCharter 7 en el ordenador del cliente

1	Conéctese a la carpeta principal en el punto de instalación administrativa (\MGXSUITE).

2	Ejecute Setup.exe.

Notas

Cuando los usuarios ejecutan la instalación del cliente desde este punto de instalación administrativa, los principales archivos del programa de FlowCharter 7 se dejan en el servidor y se ejecutan de forma remota.

El programa de instalación ubicará alrededor de 12 MB de archivos en la carpeta \Micrografx del usuario.

Los usuarios deben tener conexión de sólo lectura a la carpeta MGXSUITE del servidor mientras ejecuten el programa de instalación y cuando ejecuten los programas después de la instalación del cliente.


Soporte de nombres de archivo largos en Novell 3.11

Es posible disponer de una actualización de Novell para poder funcionar con nombres de archivo largos. Se puede encontrar en un archivo denominado os2ptch.nam que sustituye el archivo estándar Novell 3.11 os2.nam. Puede obtener este archivo está disponible a través del distribuidor de Novell.

Una vez instalado la actualización en el servidor Novell 3.11, asegúrese de que la función de nombres de archivo largos de Windows 95 se activa configurando la siguiente entrada en el archivo system.ini de Windows 95:

[nwredir]

SupportLFN=2

Para que los cambios tengan lugar, debe reiniciar Windows 95.