; mytool.def : Declares the module parameters for the application.

NAME         MYTOOL
DESCRIPTION  'MYTOOL Windows Application'
EXETYPE      WINDOWS

CODE         PRELOAD MOVEABLE DISCARDABLE
DATA         PRELOAD MOVEABLE MULTIPLE

HEAPSIZE     1024   ; initial heap size
; Stack size is passed as argument to linker's /STACK option


;;;;;;;;;;;;;;;;;;;;;;;;;
; MY CODE STARTS HERE
;;;;;;;;;;;;;;;;;;;;;;;;;

;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;
; sp_ functions from the TegoSND.DLL library
;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;;

IMPORTS
TegoSND.sp_OpenSession
TegoSND.sp_PlaySnd
TegoSND.sp_MouseOn
TegoSND.sp_MouseOff
TegoSND.sp_CloseSession

;;;;;;;;;;;;;;;;;;;;;;;;;
; MY CODE ENDS HERE
;;;;;;;;;;;;;;;;;;;;;;;;;

