P1The Enhanced Demo Data will be installed onto your hard disk in a packed
P1format.  Before you can access the Demo Data, you must un-pack it.
P1After installation, un-pack the Demo Data as follows:
P1          1) Default to the hard disk drive where Platinum is installed.
P1          2) Default to the \PLATINUM\DEMO directory.
P1          3) Type DEMO to initiate un-packing process.
P1 
P1Once un-packed, the Demo Data will occupy about 4 Mg of hard disk space.
P1          Press Y   to continue with installation.
P1          Press ESC to abort installation.
