@ Error writing setup file, PM.CFG.  Press a key to continue...  @      Error writing disk file.  Press a key to continue...      @      Error reading data file.  Press a key to continue...      @Illegal character in pathname (" / [ ] | < > + = ; , * ? space).@Press a key to set all menu page colors.  Press Escape to abort.@ Not all directories are listed.  The limit of 256 is exceeded. @No blank pages are available.  Increase menu size and try again.@   The COMMAND.COM parameter must begin with /C and a space.    @  Batch files (.BAT) are entered as a parameter to COMMAND.COM. @ The entry must include the drive name and path.  Example:  C:\ @ Press a key to overwrite existing file.  Press Escape to Abort.@  Must be a numeric value from 0 to 99.  (0 disables blanking). @Entry must be a number within the range of menu pages available.@Diskette menus are limited to 2 directory levels below the root.@     The menu size must be a number from 1 to 32,000 pages.     @ Press a key to REDUCE the menu size.  Press Escape to abort... @Acceptable options are C, P and D  (or M if this is a submenu ).@           This item was not created by this function.          @    Press a key to ERASE this page.  Press Escape to abort...   @ Do not supply a name extension.  (It is added by the program). @                                                                @  Home     ^W      Move cursor to beginning of line.            @  End      ^Z      Move cursor to end of line.                  @  L Arr    ^S      Move cursor left one character.              @  R Arr    ^D      Move cursor right one character.             @  D Arr    ^X      Move cursor to next line, accept entry.      @  U Arr    ^E      Move cursor to prior line, accept entry.     @ ^L Arr    ^A      Move cursor to prior word.                   @ ^R Arr    ^F      Move cursor to next word.                    @  Enter    ^M      Accept entry and move cursor to next line.   @  BkSp     ^H      Delete character to the left of the cursor.  @  Esc              Exit and abandon changes to current line.    @  Del      ^G      Delete character at the cursor location.     @  Ins      ^V      Toggles insert/overlay modes.                @           ^T      Delete line beginning at cursor position.    @           ^Y      Delete entire line.                          @           ^R      Restore original line (while on line).       @           ^C      Center text (menu title or help screen).     @           ^L      Lengthen text (menu title or help screen).   @                                                                @Move to item and press Enter, or type first letter of item name.@┌──────────────────────────────────────────────────────────────┐@│ F1       Help (Any key to exit)                              │@│ ** <Sp>  Move to prior or next item                          │@│ Home     Move to first item                                  │@│ End      Move to last item                                   │@│ Enter    Select item                                         │@│ Escape   Return to prior menu                                │@└──────────────────────────────────────────────────────────────┘@                                                                @[MENU]    is the sub menu where you add or change menu items.   @[HELP]    is the sub menu where you design menu help screens.   @[COLOR]   is the sub menu where you change the program colors.  @[BLANK]   sets the time for screen blanking or turns it off.    @[Path]    sets the path for DOS exit with F8, F9 or F10 keys.   @[Access]  prevents unauthorized users from changing the setup.  @[User]    is a list of user passwords for menu item access.     @[DOS]     submenu controls user access to the operating system. @[LOG]     submenu computer activity log functions.              @[TIME]    submenu controls the date and time display format.    @[Title]   Each menu page may have a title.  It may be centered  @          by pressing ^C or lengthened by pressing ^L.          @[ALTER]   This sub menu provides functions to rearrange the menu@          items after they have been entered.                   @[INDEX]   Create, update or remove a menu item index.           @[User]    Each menu item on each menu page may be assigned up to@          8 user password codes selected from the user password @          list.  Use the arrow and page keys to select the item @          and page and then enter the number for each password. @[Goto]    As an alternate to the PgUp and PgDn keys, you may go @          directly to a menu page by entering the page number.  @[Run]     This function allows you to test your menu entries.   @          Use [Run] to go to a sub menu you have just created.  @[Size]    A menu may contain up to 32,000 pages.  Be sure you   @          have 3,610 bytes of disk space for each page you wish @          to add.  Move items you wish to save before shortening@          a menu, since items on deleted pages are lost.        @[Disk]    Creates a stand-alone diskette menu from the displayed@          menu page.  Each of up to 16 items may be a Program or@          Command, submenus are not applicable.                 @Colors are set individually for each menu page.  Use the page   @keys to select the desired menu page before setting the colors. @Select [All] to set all menu pages to the displayed colors.     @                                                                @Color changes are made by repeatedly selecting the desired item.@Each time an item is selected the color will change and the new @color will be displayed on the screen.  Try the various choices @to view their effect on the screen.  Your choices are saved when@you change to a different menu page.  You may start over at any @time by selecting [Default].  This sets proper attributes for a @monochrome monitor and pleasing colors for a color monitor.     @                                                                @Toggling the [Filter] function controls retrace blanking. If you@are using a CGA adapter and color monitor you may choose to have@fast screen displays with "snow" or eliminate the "snow" and    @have slower screen displays.  If you see a flash of "snow" upon @selecting [Filter], retrace blanking is off and you will have   @fast screens.  If you don't see the flash of "snow" then retrace@blanking is on and the display will be slower.  If you have an  @EGA or monochrome system, set the snow filter for fast displays.@[BLANK]   The screen becomes blank after the set time in minutes@          of inactivity while the menu is displayed.            @[Path]    Sets the drive and directory when executing commands  @          with <F8> or <F9> and when quitting the program <F10>.@[Access]  is a password identifying persons authorized to change@          the program setup.  If a password is not entered, the @          setup program is accessible to all users.             @[User]    is a list of up to 32 user passwords for menu access. @          Each menu item may be assigned up to eight of these   @          passwords.  The list is displayed for reference while @          the passwords are being assigned to the menu items.   @[DOS]     This submenu controls access to the operating system  @          by locking or unlocking all means of exiting to DOS.  @[LOG]     This submenu provides the facilities for activating,  @          viewing, printing and maintaining the activity log.   @[TIME]    This submenu selects the date and time display format.@                                                                @(The menu bar position shows the current state of the DOS, LOG  @ and TIME functions as each of these submenus are selected).    @                                                                @Use the PgDn and PgUp keys or select [Goto] and turn to the menu@page you wish to build.  Use the Up and Down arrow keys and move@the bar to the position where you wish to add or change an item.@Select one of the following editor functions to make your entry:@                                                                @  [Program]  This is where you enter application programs such  @             as your word processor, data base or spreadsheet.  @             Most of your entries will be made here.            @  [Command]  This is where batch files, DOS commands and other  @             utilities are entered.  If a menu item doesn't run @             properly as a [Program] entry, reenter it here.    @  [Menu]     This is where sub menus are created.  Enter the    @             menu item name and the page number it is calling.  @             (Press F4 to select the first blank menu page).    @                                                                @Press F8 while making an entry to execute a single DOS command. @Press F9 to temporarily go to DOS.  Type EXIT at the DOS prompt @return to the setup program when you are finished.              @                                                                @Press F1 after selecting [Program] or [Command] for more help.  @[Goto]     Select a menu page by page number.                   @[Copy]     Copies the selected menu item into the holding buffer@           where it remains until overwritten by another item.  @[Move]     This is the same as [Copy], except the selected item @           is removed from the menu when placed in the buffer.  @           Use [Move] to delete items from the menu.  A deleted @           item may then by undeleted with the [Place] function.@[Replace]  Moves an item from the holding buffer to the selected@           menu location.  If that location contains an item, it@           is replaced by the item in buffer.  The buffer may be@           placed at any location on any menu page.             @[Swap]     The selected menu item is exchanged for the item held@           in the buffer.  You cannot swap to an empty buffer.  @[Insert]   Create a blank menu item entry at the cursor position@           and move the remaining items down one position.      @[Delete]   Delete the menu item at the cursor position and move @           the remaining items up one position.  The item that  @           was deleted is placed in the holding buffer.         @[Blank]    Erases all menu items from the displayed page.       @[Time]     Sets a starting time for the selected menu item.     @1. Enter the menu item name you wish to appear on the menu.     @2. Enter option C, P or D if you wish to clear the screen before@   running the program and/or pause before ending it.           @3. Enter the command to execute your program.  Include the drive@   and path to its location and the .COM or .EXE name extension.@   (Press F5 to find a file or F6 to display a directory list). @4. Enter any parameters you wish to send to your program.  You  @   will be prompted for parameters from the menu if you type the@   word "PARAM" on the parameter line following any other items.@5. Enter the drive and directory to change to if required.      @        DOS command line              HardDisk Manager          @   ┌─────────────────────────┬────────────────────────────────┐ @   │ C>CD\MYDIR              │ Command:   C:\MYDIR\MYPROG.EXE │ @   │ C>MYPROG /1 /2 /3       │ Parameter: /1 /2 /3            │ @   │                         │ Directory: C:\MYDIR            │ @   ├─────────────────────────┼────────────────────────────────┤ @   │ C>D:                    │ Command:   C:\WP\MYEDITOR.EXE  │ @   │ D>CD\MYDATA             │ Parameter: MYFILE              │ @   │ D>C:\WP\MYEDITOR MYFILE │ Directory: D:\MYDATA           │ @   └─────────────────────────┴────────────────────────────────┘ @1. Enter the menu item name you wish to appear on the menu.     @2. Enter option C, P or D if you wish to clear the screen before@   running the program and/or pause before ending it.           @3. Enter the command or batch file you wish to execute exactly  @   as you would enter it on the DOS command line.               @   (Press F5 to find a file or F6 to display a directory list). @4. Enter any parameters you wish to send to your program.  You  @   will be prompted for parameters from the menu if you type the@   word "PARAM" on the parameter line following any other items.@      DOS command line              HardDisk Manager            @   ┌─────────────────────┬────────────────────────────────────┐ @   │ C>CHKDSK A:/F       │ Option: D,  Command: CHKDSK A:/F   │ @   ├─────────────────────┼────────────────────────────────────┤ @   │ C>DIR C:*.*/W       │ Option: D,  Command: DIR C:*.*/W   │ @   ├─────────────────────┼────────────────────────────────────┤ @   │ C>\UTILITY\MYUTIL   │ Command: \UTILITY\MYUTIL           │ @   ├─────────────────────┼────────────────────────────────────┤ @   │ C>CD \              │ Command: MYBATCH                   │ @   │ C>MYBATCH           │ Directory: C:\                     │ @   └─────────────────────┴────────────────────────────────────┘ @Select [Goto] or use the PgUp/PgDn keys to select the menu page @and the Up/Down arrow keys to select the menu item for which the@help screen will be designed.  Select [Design] to create the new@menu help screen.  Press Escape to return to the menu when you  @have finished creating the new help screen.  The word "Help" is @now displayed beside the menu item.  If you select an existing  @screen, it will be displayed for editing.                       @                                                                @New help screens begin as a box of 16 lines.  If your screen is @less than 16 lines, select [Size] to change the length of the   @box.  Use the Up/Down arrow keys to adjust the box length, then @press Escape to return to the menu.                             @                                                                @New help screens begin as black text on a white background.  You@may change the colors by selecting [Color].  Use the Left/Right @arrows to change the text color and the Up/Down arrows to change@the background color, then press Escape to return to the menu.  @                                                                @If you want to delete a help screen or redesign an existing help@screen from scratch, select [Remove].                           @[Activate]    Instruct HARDDISK MANAGER to record computer use  @              in an encrypted file named PM.LOG.  If the file   @              does not exist, it is created.                    @[Deactivate]  Turn off the computer activity log function.      @                                                                @(The menu bar position shows the current state of this function)@                                                                @[Browse]      Display activity data.  Press any key to pause or @              continue the display.  Press Escape while paused  @              to end the display and return to the menu.        @[Print]       Print the data to a parallel printer connected to @              LPT1 using continuous paper or a cut sheet feeder.@[File]        Print the activity data to an ASCII file.  You are@              prompted for a path and filename.  An extension of@              .RPT is assigned by the program.                  @[New]         Erase the existing PM.LOG file and create a new   @              empty PM.LOG file.  Use this function to discard a@              file reaching its maximum size of 786,000 bytes or@              32,750 entries.  (About 7.5 years of normal use). @[Exit]        Return to the setup utility main menu.            @Move the menu bar to the directory where your program is located@and press Enter.  If you are selecting a command, move the menu @bar to the name of the file you want to execute and press Enter.@                                                                @Use the Up/Down arrow keys, the Home/End keys and the PgUp/PgDn @keys to move the menu bar to the desired selection.  Press the  @Escape key to exit from the directory or file displays without  @making a selection.                                             @                                                                @HARDDISK MANAGER assumes you want to change to the program's    @directory before executing the selected program.  If that is not@the case, press ^Y or ^T to erase the directory field entry.    @                                                                @HARDDISK MANAGER displays the directories and files of the      @drive it was started from by default.  To see a different drive,@enter the drive letter and a colon before pressing F6.          @                                                                @Several seconds are required to read the drive the first time F6@is selected.  After that the display is instantaneous until a   @different drive is selected to be displayed.                    @Move the menu bar to the desired file and press Enter.          @                                                                @Use the Up/Down arrow keys, the Home/End keys and the PgUp/PgDn @keys to move the menu bar to the desired selection.  Press the  @Escape key to exit from the display without making a selection. @                                                                @HARDDISK MANAGER assumes you want to change to the program's    @directory before executing the selected program.  If that is not@the case, press ^Y or ^T to erase the directory field entry.    @                                                                @HARDDISK MANAGER displays the directories and files of the      @drive it was started from by default.  To see a different drive,@enter that drive in the command field before pressing F5.       @                                                                @Enter the specification for a file or group of files in the     @command field to limit the search to specific files.  Global    @characters (* and ?) are acceptable.  If no specification is    @entered, all files (*.*) will be displayed.  All searches start @at the root directory of the specified drive.                   @   Example entries:   *.EXE   C:*.EXE   MYPROG.*   C:MYPROG.*   @                                                                @                                                                @Move the menu bar to the desired menu page and press Enter.     @                                                                @Use the Up/Down arrow keys, the Home/End keys and the PgUp/PgDn @keys to move the menu bar to the desired selection.  Press the  @Escape key to exit from the display without making a selection. @                                                                @HARDDISK MANAGER displays a sorted list of titled menu pages    @for your selection.  Menu pages with no title are considered to @be blank and are not available for selection by this function.  @                                                                @If you wish to select a blank menu page, press Escape to return @to the menu window and press function key F3.  The first menu   @page found with no title is considered to be a blank page and is@automatically entered as your selection.  Press Enter to accept @the selection and exit from the menu window.  Now select [Run]  @if you want to go to that page and enter menu items.            @                                                                @                                                                @                                                                @This function instructs HardDisk Manager to automatically run   @a selected menu item each day at a given time.  It operates when@the HardDisk Manager menu is displayed, waiting for an item to  @be selected & during the time the screen blanking feature is on.@                                                                @The menu item to be executed is selected by placing the cursor  @bar on the desired item prior to selecting the [Time] function. @The page and item number of the currently selected item and of  @the previously selected item are displayed for reference.       @                                                                @Auto start is turned off when the time display boxes are blank. @Press the Insert key to toggle the auto start feature to On and @then select the desired time using the arrow keys.  Press Enter @to accept the new settings and return to the bar menu.          @                                                                @The Escape key is used to return to the bar menu without making @any changes to the original program selection or to the original@time setting.                                                   @                                                                